
The Meta char is currently ^\ but can be set in .screenrc

Meta c or ^c	create new window
Meta k or ^k	kill current window and switch to previous
Meta ^\			kill all windows and terminate screen
Meta ^a			switch to previously displayed window
Meta 0..9		switch to window n
Meta ' '		switch to next window
Meta n or ^n	ditto
Meta -			switch to previous window
Meta p or ^p	ditto
Meta l or ^l	redisplay current window
Meta h or ^h	write current window to file
Meta .			write the termcap file
Meta w or ^w	display list of all windows
Meta t or ^t	display status
Meta v or ^v	display version
Meta a			send Meta to process in window
Meta s or ^s	send ^s to process in window
Meta q or ^q	send ^q to process in window

