Copyright: ｩ 1996-1997 Number Nine Visual Technology. All rights reserved.
Citation: HawkEye Help Release 2.0


はじめに

Number Nine のグラフィックスアクセラレータをお買上げいただき誠にありがとうございます。Number Nine の HawkEye は、総合的なディスプレイコントロールユーティリティで、Windowsアプリケーションすべてのパフォーマンスを強化し、全体的な生産性を高めるものです。

HawkEye は、Number Nine 製品のひとつとして、スピードを上げるだけではなく、Windows の生産性全体を強化します。


ユーザーズガイド

ユーザーズガイドは、Number Nine 製品とそれに付随するすべてのソフトウェアのインストール方法を詳しく説明します。また、トラブルシューティングに関する使いやすい付注意やその他の情報も含んでいます。


テクニカルサポート

弊社のカスタマーサポートは、月曜日から金曜日の米国東部標準時間/標準夏時間の午前８時から午後６時まで営業しております。

電話番号	781-674-8595
ファックスによる技術情報の提供	781-674-8595
ファックスによる問題のご相談	781-674-8661
World Wide Web	http://www.nine.com
注意: コンピュータシステムの一部として Number Nine 製品をお求めになった場合は、コンピュータメーカーに連絡してテクニカルサポートを受けてください。

迅速なサービスが受けられるよう、次の情報をご用意ください。

•	問題についての簡単な注意述

•	トラブルシューティングのために実施した手順

•	お使いのコンピュータのメーカーと機種

•	お使いのオペレーティングシステムの種類とバージョン

•	ネットワーク（お使いの場合）タイプとバージョン、ネットワークカードの種類

•	ご使用のアプリケーション名とバージョン

•	メモリ常駐ソフトウェアの名前

•	エラーメッセージ -- テキストまたはビープコード


Options

Options 機能を使用すると、ディスプレイドライバ設定をカスタマイズできます。

使用可能な Options は、ドライババージョンおよびオペレーティング システムにより異なります。現在の設定で使用可能なオプションの情報については、HawkEye IV Read_Me ファイルを参照してください。


Flat Panel Adjustment

Number Nine/SGI フラットパネルディスプレイパッケージで使用します。Flat Panel Adjustmentを使用すると、フラットディスプレイのバックライトの明度と色温度を調節できます。

フラットパネルディスプレイの明度を調節するには、バックライトの明度スクロールバーを使用します。スクロールボックスを右にスクロールするとディスプレイが明るくなり、左にスクロールすると暗くなります。

フラットパネルディスプレイの色温度を調節するには、色温度スクロールバーを使用します。スクロールボックスを右にスクロールするとディスプレイの青色電球がより多く使用されて色温度が上がり、左にスクロールすると赤色電球がより多く使用されて色温度が下がります。スクロールバーのほかに 3 つの既定の色温度設定があり、いずれかを選択することも可能です。

バックライトの明度と色温度は相互に関係しているので、いずれかのスクロールバーを使用すると、もう 1 つのスクロールバーのスクロールボックスが移動することがあります。

目的のバックライトの明度および色温度に設定したら、ディスプレイ設定の保存...ボタンをクリックして、これらの値をフラットパネルのメモリに保存します。フラットパネルのメモリに保存されている設定は、すべての VGA および高解像度ディスプレイモードで使用されます。


テキストファイル

これらのファイルには、テクニカル・ヒント、トラブルシューティング方法、お使いの Number Nine ソフトウェアに関する最新情報が含まれています。これらのファイルには .TXTまたは .DOC の拡張子が付いており、Windows ディスクおよび Windows ディレクトリの NUMBER9 サブディレクトリ内にあります。


 HawkEye の使い方

タスクバーの [image] をクリックします。 Number Nine HawkEye Properties が表示されます。 HawkEye Properties には、Number Nine HawkEye アプリケーションのすべての特性シートが含まれています。

HawkEye の特性シートを表示するには、特性シートのタブをクリックし HawkEye アプリケーションを表示します。HawkEye アプリケーションのアイコンと 9 の間にあるテキストリボンにアプリケーションの 注意述が表示されます。

 HawkEye Properties を閉じるには、 OKをクリックするか、特性シートの右上の [image] をクリックするか、ウィンドウの左上の [image] をクリックして［閉じる］を選びます。

HawkEye をシャットダウンするには、タスクバーにある 9 アイコンをクリックし、  HawkEye 95のシャットダウンを選びます。

各 HawkEye 特性シート には、同様の機能を持つキーが含まれています。

適用 -- 選択を保存し、HawkEye Properties を開いたままにします。

キャンセル --  選択を保存せずに、HawkEye Properties を終了します。

OK --  選択を保存し、 HawkEye Properties を終了します。


Hawk キー

Hawk キーを利用すると、 Zoom、 Place Windows 、 Stop Box の各機能にキーボードのホットキーを指定することができます。機能にホットキーを指定すると、ホットキーを押すだけで HawkEye の機能を簡単に起動できます。ファンクションキーはキーボードの上部にあるFではじまるキー、F1、F2、F3、F4、F5、F6キーなどです。

関連項目

•	各機能にホットキーを指定するには


各機能にホットキーを指定するには

1.	HawkEye タブをクリックして、Hawk キーの特性シートを表示します。特性シートに表示されているZoom、Stop Box、Place Windows ウィンドウボックスのいずれかをクリックします。選択したウィンドウボックスに点滅するカーソルが表示されます。

注意

0	HawkEye アプリケーションのそれぞれにホットキーを選択することをお薦めします。

2.	各機能に指定するために、F1、F2などの キーボード機能キーまたは有効なホットキーの組合せをタイプします（下注意を参照）。適用 をクリックして選択を保存します。

たとえば、Zoom ウィンドウボックスをクリックします。ホットキーのウィンドウボックスに F12 または有効なホットキーの組合せをタイプして、適用 をクリックし選択を保存します。F12、または有効なホットキーの組合せを押すと、どのアプリケーションからでも Zoom 機能が起動します。

有効なホットキーの組合せ:

すべてのファンクションキー

0	Alt + Any キー

1	CTRL + どれかのキー

2	Shift + ファンクションキー

注意

0	ファンクションキーは、キーボードの上部にある F で始まるキーです。

1	ホットキーを使用しない場合は、スペースバーまたは Esc キーを押してください。ウィンドウボックスに、なしと表示されます。

3.	Stop Box とPlace Windows 機能にも同じ手順で行ないます。

0	4.	C変更を保存し HawkEye Properties を開いたままにするには、 適用 をクリックします。変更を保存しないで  HawkEye Properties を終了するには、Cancel をクリックします。

1	5.	作業が終わったら OK をクリックして、変更を保存し HawkEye Properties を終了します。


Resolution Exchange

Resolution Exchange を使うと、拡張仮想デスクトップの作成、モニタ解像度の変更、画面に表示される色数の変更を行なうことができます。

関連項目

•	色数やモニタの解像度を変更するには

•	仮想解像度を選択するには


モニタの解像度と色数

カラー選択はオプションボタンのリストで表されます。選択オプションのボタンには、使用できないことを示す黒点も含まれます。

モニタと仮想解像度の選択はリストボックス内にあります。リストボックス内の選択項目は一度にひとつしか選択できません。

利用できる解像度は、お使いの Number Nine ボードのメモリ量、選択した色数、モニタの最大解像度により異なります。

注意

新しい色深度を選ぶと、変更を実行するために Windowsを再起動するよう指示が表示されます。モニタの解像度や仮想解像度を変更した場合、OKをクリックすると、画面が数秒ブランクになってから新しい解像度に変わります。

関連項目

•	色数やモニタの解像度を変更するには


色数やモニタの解像度を変更するには

作業を開始する前に開いているファイルをすべて保存します。

0	1.	カラーリストボックスで、カラーオプションボタンをクリックします。オプションボタンには黒点も含まれます。

注意

0	色数を変更すると利用できる解像度も変更することがあります。

2.	モニタ リストボックスで、モニタ 解像度をクリックします。モニタ リストボックスには利用できる解像度が含まれています。ひとつ選んでクリックします。高い解像度を選ぶと、表示部分が大きくなります。

0	3.	仮想リストボックスで非仮想または virtual resolution.を選びます。仮想デスクトップを拡張したくない場合は、非仮想を選んでください。

1	4.	適用 をクリックして設定を保存し、HawkEye Propertiesを開いたままにするか、キャンセルをクリックして設定を保存せずにHawkEye Propertiesを終了します。

2	5.	作業が終了したら OK をクリックして、新しい設定を保存し、HawkEye Propertiesを終了します。


仮想解像度

仮想拡張解像度は、モニタの最大解像度に係わりなく、お使いのWindowsデスクトップのサイズを２倍以上にすることができます。拡張された仮想部分は、画面の境界線を越えてマウスでパニングすることにより表示されます。例としては、仮想リストボックスで Double Wide_ を選びます。ディスプレイ グラフィックには "Double Wide" デスクトップが表示され、適用または OK をクリックすると適用されるデスクトップサイズが表示されます。

拡張デスクトップを使用するには様々な方法があります。たとえば、表計算時により多くの行や列を表示することができます。または、同時に２つのフルサイズのアプリケーションを並べて表示することができるので、アプリケーション間の操作にかかる時間を最小限にでき、カットやペーストにかかる時間も数分から数秒に短縮できます。

注意

0	利用できる仮想解像度の数は、お使いのNumber Nine製品のメモリ量とアクティブなモニタの解像度によって異なります。

関連項目

•	仮想解像度を選ぶには


仮想解像度を選ぶには

作業を開始する前に、アプリケーションで開いているファイルをすべて保存します。

0	1.	NonVirtual、DoubleWide凵ATwoTall凵Aまたは Big が含まれる仮想解像リストボックスで解像度をクリックします。Number Nine ボードおよび実解像度によっては、リストに含まれないオプションがあります。

1	ディスプレイ グラフィックには各解像度の相対表示部分が表示されます。

2	2.	適用をクリックして、選択を保存しHawkEye Properties を開いたままにするか、キャンセルをクリックして設定を保存せずに HawkEye Properties を終了します。新しい解像度を選ぶと、新しい解像度に切替わる前に画面が数秒ブランクになることがあります。

3	3.	作業が終了したら、OKを選んで新しい設定を保存し HawkEye Properties を終了します。


Place Windows

想解像度を使用する場合、ポップアップ メッセージやダイアログウィンドウが、通常モニタの中央ではなく拡大された仮想デスクトップの中央に表示されるため、直接には見えないことがあります。 Place Windows を使用すると、メッセージやダイアログをモニタの中央に表示させることができます。

Place Windows に Hawk キーを使うと、ワンタッチでアクティブなアプリケーションを拡大された仮想デスクトップではなく通常モニタに合わせて表示でき、必要な情報がすべて見えるようになります。

関連項目

•	Place Windows オプションを設定するには

•	Place Windowsでホットキーを使用するには


Place Windows オプションを設定するには

1.	メッセージの中央揃えボックスで、モニタ部分または仮想部分を選びます。モニタ部分を選ぶと、メッセージとダイアログボックスがモニタの中央に配置されます。仮想部分を選ぶと、メッセージとダイアログウィンドウが仮想ディスプレイの中央に配置されます。

2.	オプションのひとつを選ぶには、マウスを使って選択項目の横の丸をクリックします。黒点が選択されたことを示します。

3.	適用をクリックして設定を保存し、HawkEye Properties を開いたままにするか、キャンセルをクリックして設定を保存せずに HawkEye Properties を終了します。

4.	作業が終わったら、 OK をクリックして、選択を保存し HawkEye Properties を終了します。


 Place Windows の使い方

仮想 デスクトップの使用中は、アプリケーションが通常モニタではなく拡大された仮想デスクトップに合わせて表示されるため、マウスを使ってパニングして探さない限りスクロールバーやメニューリボンなどの情報が画面に表示されないことがあります。

仮想解像度を使用中にアクティブなアプリケーションを通常モニタに合わせて表示するには、Place Windows の  Hawk キー を押します。ホットキーを押す前にアクティブなアプリケーションが画面の表示部分に配置されていなかった場合、アクティブなアプリケーションが見える位置に自動的に移動します。


Place Windows でホットキーを使うには

Hawk キー 特性シートで選択したPlace Windows 用のホットキーは、Place Windows特性シート特性シートに表示されます。どのアプリケーションからでもこのホットキーを押すことができます。これで、アプリケーションの大きさをモニタに合わせることができ、Place Windowsでモニタか仮想のどちらかを選ぶことにより、メッセージボックスを通常モニタまたは仮想画面の中央に表示することができます。


Stop Box

仮想 解像度を使用している際に、画面がスクロールする領域を一時的に制限したいことがあります。Stop Box を使うと、水平方向、垂直方向、あるいは両方向の移動機能を停止させることができます。注意：Stop Box はズームモードでも使用できます。

関連項目

•	Stop Box オプションを設定するには

•	Stop Boxでホットキーを使用するには


Stop Box オプションを設定するには

1.	境界線の色リストボックスで矢印をクリックして、境界線の色を表示します。別の色を選択していない限り、画面のパニング部分は赤のラインで表示されます。赤以外の色を選ぶには、カラーバーをマウスでクリックします。

両方向	両方向の移動機能を停止します。.
水平方向	水平方向の移動機能を停止します。
垂直方向	垂直方向の移動機能を停止します。

2.	停止方向リストボックスからオプションを選びます。リストボックスの左側に選択内容が表示されます。

3.	適用をクリックして変更を保存してHawkEye Properties を開いたままにするか、キャンセルをクリックして、変更を保存せずにHawkEye Properties を終了します。

4.	作業を終了したら、 OK をクリックして選択を保存し終了します。


Stop Box の使い方

1.	選択した Stop Box Hawk キー, を押します。境界線の色メニューから色を選択した場合は、その色の境界線がパニング部分を示します。

2.	Hawk キー, をもう一度押します。通常のパニング機能が回復し、境界が排除されます。


Stop Box でホットキーを使うには

Stop Box 用のホットキーは Hawk キー 特性シートで選択されます。これは Stop Box 特性シートのホットキーウィンドウに表示されます。どのアプリケーションからでもホットキーを押せば、選択された方向の仮想パニング機能が停止します。


Zoom

ズームは、簡単にすばやく画面を拡大できる機能です。ズームファクターは、お使いの Number Nine ボードにより異なります。

関連項目

•	ズームオプションを設定するには

•	ズームでホットキーを使うには


Zoom オプションを設定するには
ズームオプションを設定するには

拡大レベルはズームファクターのグループボックスに表示されます。ご利用になれるズームレベルの数は選択された解像度や色深度によって異なります。アクティブな拡大レベルは、チェックマークで示されます。

1.	C現在アクティブになっているズームレベルをクリックして機能を停止させます。アクティブになっていないレベルをクリックしてアクティブにします。レベルすべてをアクティブにすることもできるし、まったくアクティブにしないこともできます。アクティブになったズームレベルにはチェックマークが付きます。

2.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

3.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。


Zoomの使い方
 ズームの使い方

ズームに指定したHawk キー ホットキーを押します。選択された拡大レベルの中で一番低いものに合わせて画面が拡大されます。ホットキーをもう一度押します。

拡大レベルがひとつだけ選択されている場合は、表示が通常に戻ります。複数の拡大レベルが選択されている場合は、ホットキーを押すたびに次のレベルがアクティブになります。

最後の拡大レベルに達した後でホットキーを押すと、表示は通常に戻ります。


Zoomでホットキーを使うには
ズームキーでホットキーを使うには

ズーム機能で使うホットキーは、Hawk キー 特性シートで選択し、選択後は特性シートに表示されます。Hawkキーの特性シートでホットキーを選択した後は、どのアプリケーションからでもこのキーを押せば画面が選択された一番下のレベルに拡大されます。

ホットキーをもう一度押すと、選択された次のレベルに画面が拡大します。最後の拡大レベルに達した後でホットキーを押すと、表示は通常に戻ります。


Chameleon Cursor

カメレオンは周囲の環境に合わせて体色を変えることで知られています。Chameleon Cursorも変化する背景色に応じてカーソルの色を変えることができます。たとえば、濃い背景色のアプリケーションで作業していると、カーソルに明るい色を使用して、カーソルを目立たせたいことがあります。

また、Chameleon Cursorでは、カーソルを見やすくするためにカーソルのサイズを大きくすることもできます。

関連項目

•	カーソルの色を変えるには

•	カーソルの大きさを変えるには


カーソルの色を変えるには

Chameleon Cursor ウィンドウはカーソルの色の赤、緑、青の量を調節する３つのスクロールバーを表示します。

1.	Windowsのアプリケーションのスクロールバーと同じ方法で、これらのスクロールバーを使います。

Cサムパッドをクリックし、スクロールバーを上下に動かしてカーソル内のその色の量を加減します。各カラーバーの最高値は255です。カカーソルの色を変えるには

HawkEye ヘルプリリース2.0ー値を増やすとその原色を増やし、値を下げるとその色の量を減らします。

Bこれらのカラー値を変更することにより、三原色を混ぜて好きな色を作ることができます。たとえば、カーソルを赤にするには、赤のスクロールバーを255に設定し、緑と青を０にします。カーソルを黒にするには、カラー値すべてを０にします。カーソルを白にするには、カラー値をすべて255にします。

2.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

3.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

注意

スクロールバーを上下させるとカーソルの色が変わります。


カーソルの大きさを変えるには

1.	大きいカーソルのボタンをクリックするとサイズが変わります。次に標準カーソルのボタンをクリックします。

2.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

3.	作業が終わったら、OKをクリックして変更を保存し、HawkEye Properties を終了します。


Monitor Adjustment

Monitor Adjustment はリフレッシュレートを調節してお使いのモニタを最高の性能で使用できるようにします。

関連項目

•	垂直リフレッシュレートを変更するには

•	アドバンスト・リフレッシュレートを使うには


リフレッシュレート

垂直リフレッシュレートは開始時に60Hzに設定されます（これが現在の設定となります）。お使いのモニタが特定の解像度で 60Hz 以上のリフレッシュレートをサポートする場合、Monitor Adjustment を使ってこれらの解像度のリフレッシュレートを高く設定することができます。リフレッシュレートを上げると、目の疲れの原因となる画面のちらつきを抑えることができますが、画面の明度、表示の質、個々の受信状態など、画面の全体的な質に影響を与えることがあります。

警告

モニタがサポートしていないリフレッシュレートを設定すると、モニタに永続的な破損を招くことがあります。リフレッシュレートを上げる前に、モニタの説明書をよく読んでください。

関連項目

•	垂直リフレッシュレートを変更するには

•	アドバンスト・リフレッシュレートを使うには


リフレッシュレートを変更するには

1.	アプリケーションを開始すると、リフレッシュレート選択ウィンドウにリフレッシュレートのリストが表示されます。現在使用されているリフレッシュレートはハイライト表示されます。

警告

リフレッシュレートを選択する際には、お使いのモニタがサポートできることを確認してください。そうでないとモニタに永続的な破損を招くことがあります。詳細はモニタのユーザーズガイドをご覧ください。

2.	リフレッシュレートを選択するには、そのレートを１回クリックします。選択したレートがハイライトされます。継続をクリックします。テスト模様が表示されます。５秒テストが実施され、モニタが選択されたリフレッシュレートをサポートできるか判断します。

警告

テスト中に、画面がブランクになったり、歪んだり、ノイズが生じる場合、お使いのモニタは選択されたリフレッシュレートをサポートできません。[Esc]キーを押してただちにテストを中止してください。

3.	モニタのテストが無事に終わり、新しい設定で良いか尋ねるメッセージボックスが表示されたら、[はい]を選びます。新しいリフレッシュレートに切替わる前にモニタが数秒真っ暗になることがあります。画面がブランクになったり、スクランブルした場合は[いいえ]を選びます。

4.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

5.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

注意

リフレッシュレートはテストされた解像度だけに変更します。


アドバンスドリフレッシュレートの使い方
カスタム・リフレッシュレートを使うには

1.	カスタムをクリックして、Monitor Adjustmentのカスタム設定ウィンドウを開きます。

２	垂直リフレッシュレートを上げるには上向き矢印をクリックすると、 1 Hz ずつ高くなります。リフレッシュレートを下げるには、下向き矢印をクリックします。

•	垂直リフレッシュレート -- １秒間に画面が更新される回数

•	水平スキャンレート -- １秒間に更新されるピクセル数

3.	リフレッシュレートを選択したらOKをクリックします。リフレッシュレート選択ウィンドウにモニタのカスタム設定が表示され、カスタムとレベルが付きます。適用をクリックします。選択したリフレッシュレートをモニタがサポートするかを判断する５秒テストが行われます。

警告

テスト中に、画面がブランクになったり、歪んだり、ノイズが生じる場合、お使いのモニタは選択されたリフレッシュレートをサポートできません。[Esc]キーを押してただちにテストを中止してください。

4.	モニタのテストが無事に終わり、新しい設定で良いか尋ねるメッセージボックスが表示されたら、[はい]を選びます。新しいリフレッシュレートに切替わる前にモニタが数秒真っ暗になることがあります。画面がブランクになったり、スクランブルした場合は[いいえ]を選びます。

5.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

6.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

注意

垂直リフレッシュレートを上げると、水平スキャンレートも上がります。選択された垂直リフレッシュレートを表示するためには、お使いのモニタがそれに一致する水平スキャンレートをサポートできることが必要です。

リフレッシュレートはテストされた解像度だけに変更します。


Status

Status は、お使いの Number Nine 製品のハードウェアとソフトウェア情報を提供します。この情報は弊社にご質問いただくときに特に役立ちます。

この情報を表示するには Status をクリックします。


Information

Informationは、Number Nine Visual Technology の住所、World Wide Web からのアクセス方法などを含む情報を提供します。

この情報を表示するには Informationをクリックします。


International Exchange

Number Nine Windows ソフトウェアは各国語で表示することができます。

関連項目

•	別の言語で表示するには


別の言語で表示するには

1.	希望する言語の横のオプションボタンをクリックします。選択されたオプションボタンには黒丸が付きます。

0	2.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

1	3.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。


Release Notes

リリースノートには、Number Nine のハードウェアとソフトウェアに関する最新情報、技術的なヒント、トラブルシューティングのテクニック、ドライバ強化その他の項目が含まれています。ここに含まれる情報は、ソフトウェアをリリースする直前の情報で、他のドキュメントには注意載されていないことがあります。

関連項目

•	リリースノートを表示するには


リリースノートを表示するには

1.	Number Nine Release Notes アイコンをクリックします。

0	2.	スクロールバーを使って、文書全体に目を通すか、検索メニューを使ってトピックを探します。


ColorPerfect

ColorPerfect は画面上でWYSIWIGを完全に実現するため簡単なガンマ修正を行います。ガンマ修正は出力カラー（アナログ）をコンピュータからの入力（デジタル）カラーに近くなるように較正する手法です。

0	画面の色をPantone＊ブックやカラープリンタとマッチするようにし、正確な結果が出るように作業を修正することができます。画面を調整してネガ・イメージで作業できるようにすることも可能です。

関連項目

•	カーブ手法で色を修正するには

•	リニア手法で色を修正するには

•	リニア手法で色を修正するには

•	ColorPerfect ファイルをロードするには

•	ColorPerfect ファイルを自動的にロードするには


ColorPerfect の使い方

ColorPerfect ガンマ修正の使い方は簡単です。Colro Perfectを選ぶとメニューが３つのグラフを表示します。RGB:赤、緑、または青、あるいは CMY:シアン・マゼンタ、イエローのどちらかですが、RGBがデフォルトです。コンピュータで使用されるデジタルカラーとモニターが表示するアナログカラーには大きな違いがあります。

信号がモニタに到達すると、コントラストや明度、モニタの年数、周囲の明かりなどの環境や機械的な変数に遭遇します。こうした要素は画面に表示される色をわずかに変更するので、条件が変わるたびに較正手順を繰り返す必要が生じることがあります。次のような例が考えられます。

•	新しいモニタを購入した

•	作業エリアの照明を変えた

•	モニタのコントラストや明度を変えた

•	モニタの年数が経って出力に変化が出た

ColorPerfect は色修正に次の２つの手法を使用します。

•	カーブは色のミッドトーンを変更します。

•	リニアは色のエンドトーンを変更します

また、ColorPerfect は コントラスト メニュー を使って、明暗を調整します。

注意

ColorPerfect を使って、コンピュータの立ち上げ時にこのファイルを自動的に実行するように設定することもできます。

関連項目

•	ColorPerfect


カーブ手法で色を修正するには

Color Perfect をクリックすると、RGB （赤、緑、青）またはCMY （シアン、マゼンタ、イエロー）どちらかの３つのグラフが表示されます。はじめてColor Perfect を使用する場合は、デフォルトの RGB が表示されます。

1.	オプションバーをクリックして、Color Perfect メニューを表示します。

0	2.	カラー選択モード オプションで、  RGB または CMYをクリックします。 選択された項目には黒丸が付きます。

1	3.	ランピングスタイルオプションで、 カーブ.をクリックします。 選択された項目には黒丸が付きます。  OKをクリックして、カラーグラフを表示します。 ひとつ前の選択に戻るには キャンセルをクリックします。 カラーグラフが再び表示されます。

2	4.	カラーグラフで、３つのカラーグラフの横にあるスクロールバーのスライダーをクリックして、スクロールバーを上下に動かします。

デフォルトのガンマ値は各カラーボックスの左上に表示され、開始時には 1/1.00を示しています。スクロールバーを上に動かすと色飽和が増加し、下に動かすと減少します。変更を削除するには、オプション、ガンマのリセットを選び、OKをクリックします。

5.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

0	現在のファイル以外のファイルに変更を保存するには、オプションバーをクリックします。ファイルオプションで名前を付けて保存を選びます。ファイル名ボックスにファイル名をタイプし保存をクリックします。ファイル名には自動的に.gma の拡張子が付きます。

1	6.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

注意

スクロールバーを上下すると画面下のカラーバーのグラフの色が変わります。

0	反転を選んだ場合、ガンマのリセットがこの機能を停止します。反転オプションはモニタの表示色を逆にします。


リニア手法で色を修正するには

1.	オプション バーをクリックして Color Perfect メニューを表示します。

0	2.	RGB または CMYをクリックします。

1	3.	リニア を選び、 OK をクリックしてカラーグラフを表示します。 キャンセル をクリックするとひとつ前の選択に戻ります。

2	4.	カラーグラフのひとつをクリックし斜線のどちらか一方のハンドルを押さえてラインを上下に動かします。変更を削除するには、オプション、ガンマのリセットを選び、OKをクリックします。

3	5.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

4	現在のファイル以外のファイルに変更を保存するには、オプションバーをクリックします。ファイルオプションで名前を付けて保存を選びます。ファイル名ボックスにファイル名をタイプし保存をクリックします。ファイル名には自動的に.gma の拡張子が付きます。

5	6.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

注意

斜線を上下すると画面下のカラーバーのグラフの色が変わります。

0	反転を選んだ場合、ガンマのリセットがこの機能を停止します。反転オプションはモニタの表示色を逆にします。

関連項目

•	ColorPerfect ファイル


明暗を調整するには

1.	オプションバーをクリックして Color Perfect メニューを表示します。

0	2.	コントラストを表示します。

1	3.	カーブまたはリニアをクリックします。

2	4.	OK をクリックしてコントラスト修正グラフを表示します。カーブを選択した場合は、スクロールバーをクリックして、スクロールボックスを上下に動かします。デフォルトのガンマ値は開始時で1/1.00です。色飽和はスクロールバーを上に動かすと増加します。スクロールバーを動かすと、カラーバー、コントラストグラフ、背景色が変化します。

3	リニアを選択した場合は、斜線をクリックしてどちらか一方のハンドルを押さえてラインを上下に動かします。変更を削除するには、オプション、ガンマのリセットを選び、OKをクリックします。

4	5.	適用をクリックして、変更を保存して HawkEye Properties を開いたままにするか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。

5	現在のファイル以外のファイルに変更を保存するには、オプションバーをクリックします。ファイルオプションで名前を付けて保存を選びます。ファイル名ボックスにファイル名をタイプし保存をクリックします。ファイル名には自動的に.gma の拡張子が付きます。

6	6.	作業が終わったら、OKをクリックして変更を保存し、 HawkEye Properties を終了します。

関連項目

•	ColorPerfect ファイル


ColorPerfect ファイル

様々な ColorPerfect ファイルを作成し、必要に応じて利用することができます。

関連項目

•	ColorPerfect ファイルをロードするには

•	ColorPerfect file を自動的にロードするには


ColorPerfectファイルをロードするには

1.	オプションバーをクリックして、Color Perfect メニューを表示します。

2.	ファイルオプション で開くをクリックします。

3.	選択したい ファイルをクリックしてから 開くをクリックします。ただちにファイルがロードされます。.

4.	OKをクリックします。

5.	作業が終了したらOKをクリックして、変更を保存して HawkEye Properties を終了するか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。


ColorPerfect ファイルを自動的にロードするには

1.	毎回アプリケーションを開始するたびに ColorPerfect ファイルが自動的にロードされるようにするには、オプションをクリックします。

2.	ファイルオプションで,  デフォルトの設定...をクリックします。

3.	デフォルトファイルとしてロードするファイルをクリックしてから、オープンをクリックします。

4.	OK をクリックして、選択したファイルをデフォルトファイルとして保存します。

5.	作業を終了したら OK をクリックして変更を保存し HawkEye Properties を終了するか、キャンセルをクリックして変更を保存せずに HawkEye Properties を終了します。次回から ColorPerfect を開始するたびに、またWindows を再起動するたびに、デフォルトファイルがロードされます。


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Chameleon Cursor.


スタンダードまたはラージをクリックします。


色のシェードを加減します。


赤の量を加減します。


緑の量を加減します。


青の量を加減します。


スタンダードサイズ


ラージサイズ


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Hawk キー


ホットキーをZoomに指定します。


ホットキーをStop Box に指定します。


ホットキーを Place Windows に指定します。


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Resolution Exchange.


Resolution Exchange View Box.


Display Area Legend.


色深度を選択します。


モニタの解像度を選択します。


拡大された仮想解像度または非仮想解像度を選択します。仮想解像度を選択しない場合は、非仮想解像度がハイライトされていることを確認します。


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Place Windows.


メッセージボックスをモニタの表示部分または仮想部分に配置します。


Place Windows 凡例


Place Windows メッセージボックス


アプリケーションを最大化するために現在使用されているホットキー

(上書き禁止、Hawk キー  を使って変更)


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Stop Box.


Stop Box View Box.


Stop Box 凡例


Stop Box 境界線の色.


Stop Box 停止方向


仮想パニングに現在使用されているホットキー

(上書き禁止,  Hawk キー  を使って変更)


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Monitor Adjustment.


現在選択されている仮想リフレッシュレート


VESA (Video Electronics Standards) 専用 リフレッシュレート


リフレッシュレートを変更するためにダイアログボックスを表示します。


リフレッシュレートを約 1Hz 増加します。


リフレッシュレートを約１Hz 減少します。


仮想リフレッシュレートを手動で変更します。


水平方向のスキャンレートを自動的に変更します。


選択されているリフレッシュレートのプレビュー


このダイアログボックスを終了し、変更をすべて保存します。


変更をすべて取消してダイアログボックスを終了します。


ヘルプテキストの表示.


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Zoom


Zoomアイコン


Zoomファクター-- これらのファクターはお使いの Number Niveボードにより異なることがあります。


Zoomに現在使用されているホットキー

(上書き禁止,  Hawk キー  を使って変更)


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


International Exchange.


HawkEye テキストに使用する言語を選択します。


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Color Perfect.


赤の量


緑の量


青の量


シアンの量


マゼンタの量


イエローの量


コントラストグラフ-- 明暗を加減します。


Color Perfect の高度なオプションを表示します。


修正したガンマ値をファイルに保存したりファイルから検索します。


カラーグラフを選択し表示します。


ガンマ修正の方法


デフォルト設定に戻ります。


修正したガンマ値を現在のファイルに保存します。


修正したガンマ値を新しいファイルに保存します。


ファイルのロード


スタートアップでロードされるガンマ修正ファイル名


 RGB グラフを表示します。


 CMY グラフを表示します。


コントラストグラフを表示します。


ガンマ修正のタイプ、 ミッドトーンの変更


ガンマ修正のタイプ、エンドトーンの変更


モニタの表示色を反対にします。


変更を保存してダイアログボックスを終了します。


HawkEye Release 4.0
ｩ 1996-1998 Number Nine Visual Technology.
All rights reserved.


Status.


ハードウェア情報


BIOS 情報


ドライバ情報


フラットパネルの調節機能


明度を調節します。


色温度を調節します。


既定の色温度を利用します。


変更をフラットパネルディスプレイに直接保存します。