; Assembler source library
; Copyright (c) 2002 Arkady Belousov <ark@mos.ru>
;
; This library is free software; you can redistribute it and/or modify it
; under the terms of the GNU Lesser General Public License as published by
; the Free Software Foundation; either version 2.1 of the License, or (at
; your option) any later version.
;
; This library is distributed in the hope that it will be useful,
; but WITHOUT ANY WARRANTY; without even the implied warranty of
; MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
; GNU Lesser General Public License for more details.
;
; You should have received a copy of the GNU Lesser General Public
; License along with this library; if not, write to the Free Software
; Foundation, Inc., 59 Temple Place, Suite 330, Boston, MA  02111-1307  USA
;

OPCODE_MOV_AL	equ <db 0B0h>
OPCODE_MOV_CL	equ <db 0B1h>
OPCODE_MOV_DL	equ <db 0B2h>
OPCODE_MOV_BL	equ <db 0B3h>
OPCODE_MOV_AH	equ <db 0B4h>
OPCODE_MOV_CH	equ <db 0B5h>
OPCODE_MOV_DH	equ <db 0B6h>
OPCODE_MOV_BH	equ <db 0B7h>
OPCODE_MOV_AX	equ <db 0B8h>
OPCODE_MOV_CX	equ <db 0B9h>
OPCODE_MOV_DX	equ <db 0BAh>
OPCODE_MOV_BX	equ <db 0BBh>

OPCODE_ADD_AX	equ <db 05h>
OPCODE_AND_AX	equ <db 25h>
OPCODE_XOR_AX	equ <db 35h>
OPCODE_OR_AL	equ <db 0Ch>
OPCODE_AND_AL	equ <db 24h>
OPCODE_XOR_AL	equ <db 34h>
OPCODE_CMP_AL	equ <db 3Ch>

OPCODE_CMP_DI	equ <db 81h,0FFh>
