┌────────────────────────────────────────────────────────────────────────────┐
│ Help:  Read New Mail prompt                                                │
└────────────────────────────────────────────────────────────────────────────┘

   Description

      This command provides a quick method to read your new mail, or all
      new mail, when logging into The File Bank.

   Navigation - GRAPH / ANSI display modes (M GRAPH, M ANSI)

         Key            Action
         -------------- -----------------------------------------------
         Cursor Right   move hilite / cursor to the right
         Space          move hilite / cursor to the right
         Cursor Left    move hilite / cursor to the left
         BackSpace      move hilite / cursor to the left
         Home           move hilite / cursor to left-most option
         End            move hilite / cursor to right-most option

         N              move hilite / cursor to 'No' option
         Y              move hilite / cursor to 'Yours' option
         A              move hilite / cursor to 'All' option
         H              move hilite / cursor to 'Help' option

         Enter          execute hilited / cursor option
         -------------- -----------------------------------------------

         When in GRAPH mode, the current option will be hilited.

         When in ANSI mode, the current option will have the cursor flashing
         under the 'trigger' (capitalized) letter of the option.


   Navigation - CTTY display mode (M CTTY)

         Key            Action
         -------------- -----------------------------------------------
         (inactive)     (not applicable in CTTY mode)

   Options

         N     - No, do not read new mail now (default).

         Y     - Yours, read new mail addressed to you, found in any
                 conferences that you have selected for mail scans.

         A     - All new mail, both to you and public mail to all users,
                 in every conference that you have selected for mail
                 scans. All new mail in any conference will be displayed
                 IF there is at least one new message addressed to you
                 in that conference. If a conference has new mail but
                 none addressed to you, the conference will be skipped.

         H     - Help, display help screen (you are here now).

         Choose the desired option, either via moving the hilite/cursor
         or pressing the appropriate key, and press ENTER.

         The default answer for the Read New Mail prompt is
         No. Pressing ENTER alone is the same as pressing 'N' and ENTER.

         Following with PCBoard's default behavior for this prompt,
         a timeout of 20 seconds will occur after no keyboard activity.
         The default option chosen if a timeout occurs is 'No'.


   < end of Read New Mail now prompt help >
