@CLS@@X07            Dark Creation @X08[C@X07AL@X0FCU@X07LU@X08S] @X07Presents@X0F: A@X07r@X08t @X0FGa@X07lle@X08ry @X0F1@X07.@X080 @X0FH@X07el@X08p    [@X07Pg @X0F1@X07/@X0F2@X08]
@X08                       ··∙∙∙───@X07────@X0F─────────@X07────@X08───∙∙∙··

@X08 ■@X0FU@X08■pload new artwork.  This function will allow you (the user) to upload new
@X08    artwork to the art gallery. It will ask you for the filename, name of the
@X08    artist, group of the artist, the description, and then ask you which pro-
@X08    tocol you wish to upload with.  Your entry will automatically be inserted
@X08    into the gallery and will be viewable/downloadable by other users.

@X08 ■@X0FD@X08■ownload artwork.  When you choose download artwork the cursor will appear
@X08    beside the first ansi on the screen.  If you hit @X0F[@X07SPACE@X0F] @X08the current ent-
@X08    try will be tagged and the cursor will move on to the next entry.  If you
@X08    however hit @X0F[@X07ENTER@X0F] @X08the cursor will simply move on to the next entry.
@X08    When you pass the last entry on the list you are given the option to down
@X08    load or to flag the files for later download.

@X08 ■@X0F#@X08■This is just the number of the artwork you want to see.  For example, if
@X08    you wanted to see ansi number eleven you would hit 11 and press @X07[@X0FRETURN@X07]
@PAUSE@
@CLS@@X07            Dark Creation @X08[C@X07AL@X0FCU@X07LU@X08S] @X07Presents@X0F: A@X07r@X08t @X0FGa@X07lle@X08ry @X0F1@X07.@X080 @X0FH@X07el@X08p    [@X07Pg @X0F2@X07/@X0F2@X08]
@X08                       ··∙∙∙───@X07────@X0F─────────@X07────@X08───∙∙∙··

@X08 ■@X0FM@X08■ore Status.  This is used to toggle whether or not you would like to pause
@X08    after displaying each page of the ansi.  If it is set to 'on' it will stop
@X08    and show you the 'Press enter to continue' prompt but if set to 'off' then
@X08    it will display the entire ansi continously.

@X08 ■@X0FN@X08■ext Page.  If there is more than one page of ansi's, this will display the
@X08    next one.  If it is on the last page and you press 'n' it will display the
@X08    first page again.

@X08 ■@X0FE@X08■xit Art Gallery 1.0 PPE.  Simply exits the program.

@X08 ■@X0FH@X08■elp.  Displays this help file.

@PAUSE@