Z;@X03G@X0BS@X0FZ ZMod@X0Be@X03m
H;@X03H@X0BS@X0FLi@X0Bn@X03k
S;@X03S@X0BM@X0Fod@X0Be@X03m
B;@X03B@X0Bi@X0F-Mod@X0Be@X03m
I;@X03I@X0Bc@X0Fe-Zmod@X0Be@X03m


; Format : 
;
; L;ProtoName
;
; Where L is the protocol letter and ProtoName is its name
;
; If an external protocol is not defined here, its name within PCBPROT.DAT
; will be used as a menu entry

