;	Copyright (c) 1996 Microsoft Corporation  All rights reserved.
;
;	This file is used to INSTALL the Web Service on a non-K2 NT server.
;




OpenMachineKey:SYSTEM\CurrentControlSet\Services\W3SVC\ASP\Parameters
ReplaceDword:MemFreeFactor;0x0
ReplaceDword:NumInitialThreads;0xa
ReplaceDword:ThreadCreationThreshold;0x2
ReplaceDword:ScriptEngineCacheMax;0x3c
CloseKey:
