;	Copyright (c) 1993-1996 Microsoft Corporation  All rights reserved.
;
;	This file is used to INSTALL an internet gateway.
;

;
;	Talking to the Service Manager
;

;		ServiceManager(SMTP)
CreateService:MSExchangeIMC;Microsoft Exchange Internet Mail Connector;connect\msexcimc\bin\msexcimc.exe;MSExchangeIS$MSExchangeMTA$Tcpip$




;		Miscellaneous
OpenMachineKey:SYSTEM\CurrentControlSet\Services
CreateSecureKey:MSExchangeIMC\Parameters
CreateKey:MSExchangeIMC\Linkage
CreateSecureKey:MSExchangeIMC\Diagnostics
CloseKey:
OpenMachineKey:SYSTEM\CurrentControlSet\Services\MSExchangeIMC\Linkage
ReplaceMultiString:Export;MSEXCHANGEIMC$
CloseKey:
OpenMachineKey:SYSTEM\CurrentControlSet\Services\MSExchangeIMC\Parameters
SetString:RootDir;%s\imcdata
SetDword:UseRTFText;0x01
SetDword:HonorSenderField;0x01
CloseKey:
OpenMachineKey:SYSTEM\CurrentControlSet\Services\MSExchangeIMC\Diagnostics
SetDword:1 Initialization/Termination;0x00
SetDword:3 Addressing;0x00
SetDword:4 Message Transfer;0x00
SetDword:5 SMTP Interface Events;0x00
SetDword:6 Internal Processing;0x00
SetDword:7 SMTP Protocol Log;0x00
SetDword:8 Message Archival;0x00
CloseKey:

;		diagnostics message file
OpenMachineKey:SYSTEM\CurrentControlSet\Services\MSExchangeIMC
ReplaceString:DiagnosticsMessageFile;imcmsg.dll
CloseKey:



OpenMachineKey:SYSTEM\CurrentControlSet\Services
CreateKey:MSExchangeIMC\Performance
CloseKey:

OpenMachineKey:SYSTEM\CurrentControlSet\Services\MSExchangeIMC\Performance
ReplaceString:Close;ClosePerformanceData
ReplaceString:Collect;CollectPerformanceData
ReplaceString:Library;%s\bin\imsperf.dll
ReplaceString:Open;OpenPerformanceData
CloseKey:



OpenMachineKey:SOFTWARE\Microsoft\Windows Messaging Subsystem
CreateKey:Applications\MSEXCIMC
ReplaceDword:MSEXCIMC;0x1
ReplaceDword:Notification Managers;0x2
ReplaceDword:Notification Worker Threads;0x2
CloseKey:

OpenMachineKey:SOFTWARE\Microsoft\Windows Messaging Subsystem\Applications\MSEXCIMC
ReplaceDword:USEMHEAPMGR;0x1
ReplaceDword:USEMNOTIFYMGR;0x1
ReplaceDword:Notification Managers;0x2
ReplaceDword:Notification Worker Threads;0x2
ReplaceDword:SharedMemMaxSize;0x10000
ReplaceDword:ProfileMemMaxSize;0x2000
CloseKey:
