 
                        The Bubble Chamber Help Log
                   Copyright (c) RH Factor Software, 1988
                            All Rights Reserved.
 
          The Bubble Chamber requires four external files to run.  The
          first is the data file.  It must be present or you would not have
          made it this far.  The other three file names are available for
          entry/edit on the program's main screen.
 
          The Input File is the program (.COM or .EXE) that you
               wish to disassemble.  The input file must be in the
               default directory.
 
          The Output File is created in the default directory.
               This file will hold the assembly language source code
               created by the Bubble Chamber.
 
          The Map File is a scratch file to hold the 'map' of
               instructions vs. data areas in the input file.
 
 
                        The Bubble Chamber Help Log
                   Copyright (c) RH Factor Software, 1988
                            All Rights Reserved.
 
          Once the file names have been set, you are free to select
          from the following functions:
 
          F3: Set Start allows you to specify the starting offset
               address, as well as the beginning and ending positions
               in the file.  Note that the addresses are all entered in
               hex.
 
          F5: Build Map directs the computer to build a map which
               defines data vs. instruction areas.  This is necessary
               before the file can be properly disassembled.
 
          F6: Edit Map.  This key allows you to change the map.
 
 
 
 
                        The Bubble Chamber Help Log
                   Copyright (c) RH Factor Software, 1988
                            All Rights Reserved.
 
          F7: Save Map.  This key saves the map for later use.
 
          F8: Load Map.  Loads a previously saved map.
 
          F9: Run.  The run key directs the program to produce
               the assembly source code.
 
          F10: Auto Run.  This key produces the same effect as
               pressing F5, F7 and F9 (Build Map, Save Map, and Run).
 
 
 
 
 
 
 
                                   NOTICE:
 
You are licensed to use the Beta Release for evaluation only.  You may make
and distribute copies of the Beta Release only.
 
To receive a copy of The Bubble Chamber, Release 1.0 send $29.00 (check, MC, or
Visa) to:
                           RH Factor Software (RSH)
                                P.O. Box 6466
                             Kent, WA  98064-6466
 
Washington Residents please add 8.1% sales tax.  Comments are always welcome.
 
Registration includes The Bubble Chamber Manual.  The manual contains details
on modifying the Bubble Chamber data file, adding macro recognition, command
line options, and customizing for different processor levels.
 
 
 
 
