The following message was sent to me via CompuServe Mail.  For all those 
stacker users out there, this message will prove usefull.
-----------------------------------------------------------------------------
Thanks for the DELAY.EXE program.  ConEd v2.7 is now compatible with
STACKER v2.0.

My system configuration is:
        486-25 Intel DX Processor (Northgate Elegance), 8mb.
        MS-DOS 5.0
        Adaptec 1542 SCSI Host Adapter.
        Maxtor LXT-340S SCSI Hard Drive (C:).
        SmartDrive Cache present (DOS 5.0 Version).
        Stac Electronics' STACKER v2.0

Here are my ConEd settings:

 1.   Program Locations:
        Root Directory (C:\)
                ConEd.Exe
                ConEd26.Cfg
        C:\ConEd\
                All ConEd Files
                All AutoExec Files
                All Config Files
                Delay.Exe
                CopyStac.Bat

 2.   ConEd Configuration (F5):
        Boot Drive:  C:\
        ConEd Path:  C:\ConEd\
        Do you use Disk Caching?  Y
        Enter the command used to FLUSH your cache: C:\ConEd\CopyStac.Bat
        Does your computer require a COLD software reboot [Y/N]:  N
        Would you like to use an alternate reboot program [Y/N]:  N

 3.   Contents of CopyStat.Bat, with 8 second delay before reboot:
        rem  *  Copying AUTOEXEC.BAT and CONFIG.SYS to D:  *
        Copy C:\AutoExec.Bat D:\
        Copy C:\Config.Sys D:\
        rem  *  WAIT FOR SYSTEM TO REBOOT  *
        C:\ConEd\Delay 8
