=============================================================================

     EBU   Execute BLR Utilities


           EBU ( Execute BLR Utilities ) is a utility menu program/shell
           which will allow you to execute any of the BLR Utilities.

           basically, if EBU and the 2 files it uses,
           ( blrut.mnu + blrut.tbl ), are in the same directory
           as the utilities,  and this directory is the current directory,
           then all the utilities may be executed from EBU.

           when you execute EBU, it will display a menu of
           all the utilities.

           when you pick the 2 digit number of the utility you wish,
           that utility will execute.

           when you are finished with that utility,
           control will be returned to EBU.

           you can then either pick other utilities or quit.

=============================================================================