      0.8  1.4  1.2  ; gamma for red-green-blue
  0    0    0    0
  1    0    0   16
 75    0    8   63
114   63    0   63
115   32    0   32
125    3    1   16
135   12    8    4
200   63   42   16
201   32   16   42   ; 201 is normal char color and CurCol
216   63   63   63
233   32   16   42
249   63   63   63

