valitek tape backup system
% 1 7 74 7 21 0 0x1f 91
. VIEWING THE TAPE DIRECTORIES:
. The first dataset directory is loaded automatically.
. To view the directory of the next dataset on the tape
. press F5. To return to the first dataset on the tape
. press F3.
.
. When you are ready to begin the restore press F9.
.
.
.
.
. THE IMAGE RESTORE PROCESS
. Before any restore occurs you will be prompted for a
. destination hard disk unit #. Be certain that the unit #
. you specify is the correct one. Once the restore begins
. critical information in the system area of the disk will
. be destroyed which will make the original data unsalvagable.
.
.
.
.
.
. When the source and target drive parameters are displayed you
. should compare the two for identical cylinders, heads, and
. sectors values. Ideally the target drive should be identical
. to the source drive. If they are not identical you may
. be able to modify the target drive parameters in your
. computer's CMOS SETUP feature by setting the drive type
. to USER DEFINED (or comparable setting) then manually
. entering the cylinders, heads, and sectors values to match
. the source drive. Your target drive unit must be at least
. as big as your source drive.
% 2 3 76 5 20 0 0x1f 140
. No help available for this option in image restore mode.
. R1
.
% 3 3 76 5 20 0 0x1f 140
. No help available for this option in image restore mode.
. R2
.
% 4 10 70 9 18 0 0x1f 140
. No help available for this option in image restore mode.
. R3
.
% 5 10 70 11 20 0 0x1f 140
. No help available for this option in image restore mode.
. R4
.
% 6 10 70 12 23 0 0x1f 128
. No help available for this option in image restore mode.
. R5
.
% 7 10 70 14 25 0 0x1f 128
. No help available for this option in image restore mode.
. R6
.
% 8 10 70 2 13 0 0x1f 128
. No help available for this option in image restore mode.
. R7
.
% 9 10 70 2 13 0 0x1f 128
. No help available for this option in image restore mode.
. R8
.
% 10 3 77 2 22 0 0x1f 128
. No help available for this option in image restore mode.
. R9
.
% 11 3 77 2 19 0 0x1f 128
. No help available for this option in image restore mode.
. R10
.
% 12 10 70 2 13 0 0x1f 128
. No help available for this option in image restore mode.
. R11
.
% 13 10 70 2 13 0 0x1f 128
. Press:
.
. Q  -  To quit out of the file backup operation.
. S  -  To ignore the error and skip the file.
.       The data on the tape for this file will be
.       CORRUPT, but the backup process can continue.
% 14 10 70 2 13 0 0x1f 128
. Press:
.
. R  -  To retry opening the file.
. Q  -  To quit out of the file restore operation.
. S  -  To skip this one file. This file data will not be
.       restored ok, but the restore process can continue.
% 15 10 70 2 13 0 0x1f 128
. Press:
.
. R  -  To retry closing the file.
. Q  -  To quit out of the restore operation.
. I  -  To ignore this file error. This file will NOT be
.       restored ok, but the restore can continue.
% 16 9 72 9 23 0 0x1f 91
.
. VIEWING THE TAPE DIRECTORIES:
. The first dataset directory is loaded automatically.
. To view the directory of the next dataset on the tape
. press F5. To return to the first dataset on the tape
. press F3.
% 17 9 72 9 23 0 0x1f 91
. To move directly to a specific dataset without manually
. advancing one dataset at a time enter the dataset
. number.
% 18 10 70 11 20 0 0x1f 140
. No help available for this option in image restore mode.
. R12
.
% 19 10 70 10 22 0 0x1f 140
. No help available for this option in image restore mode.
. R13
.
% -1 must terminate with %

