STOPWATCH

Introduction

An accessory called  " STOPWATCH" is provided. It is an audio/visual Stopwatch that runs under Microsoft Windows 3.1.

How to...

Click on the STOPWATCH

Start the STOPWATCH

Stop the STOPWATCH

Re-start the STOPWATCH

Reset  the STOPWATCH

Mute  the STOPWATCH

Switch between the analog and digital clocks

Change the font (available in the digital display mode only)

Continuously Hear Signal for Time Lapsed

Display the STOPWATCH  window on top of other windows


Click on the STOPWATCH

In the Audio Accessories folder, click on the "STOPWATCH" icon.  The analog display mode is the default display mode.  You can change the size of the Stopwatch window and move it wherever you like so that the time lapsed -including minutes and seconds, if you want, appears on the screen but uses little work space.  STOPWATCH continues to display and keep time when you reduce it to an icon.


Start the STOPWATCH

Click on the "Start" button from the STOPWATCH window to begin counting.


Stop the STOPWATCH

Click on the "Stop" button from the STOPWATCH window to stop counting. (the start button switches to stop when the Stopwatch is in operation.).

Clicking on the "Stop" will announce the time. Clicking on the "Start" button will also restart counting time, beginning at the time it was stopped.


Re-start the STOPWATCH

Click on the "Start" button from the STOPWATCH window to begin counting again.


Reset  the STOPWATCH

Click on the "Reset" button from the STOPWATCH window.

This operation will reset the Stopwatch to zero.


Mute  the STOPWATCH

Click on the "Mute" button from the STOPWATCH window.

This will  stop the "ding" announcement heard for every second lapsed.


Switch between the analog and digital clocks

From the Settings menu in the Talking Clock window, click on "Analog" or "Digital". A check mark appears next to the command.


Change the font
Change the font (available in the digital display mode only)

1.	If clock display is not currently in digital mode, click on "Digital" from the Settings menu.

2.	From the Settings menu, click on "Set Font".

The Font dialog box opens.

3.	From the Font list box, click on a font.

4.	Click on the OK button.


Continuously Hear Signal for Time Lapsed

Click on the "Mute" button from the STOPWATCH window.  This will  start the "ding" heard as announcement for every second.


Display the STOPWATCH  window on top of other windows

From the System menu in the Stopwatch  window, click on "Always On Top".  A check mark appears next to the command.