Copyright: National DataComm Corporation


ND5200 PCI Ethernet Controller

Use this dialog box to setup the network connection for the National Datacomm Corporation ND5200 PCI Ethernet controller .

AutoDetection

Twisted Pair

Twisted Pair - Full Duplex

Twisted Pair - No Link Test

BNC


AutoDetection
Check in sequence the Twisted Pair port, the BNC port and the AUI port and select the first connected port.

This detection takes place during driver initialization.Ports should be connected before the system is restarted and  cannot be switched during run time.

Autodectection does not support TP - Full Duplex mode.


Twisted Pair
Establish a 10BaseT connection through the Twisted Pair port.


Twisted Pair - Full Duplex
Establish a Full Duplex 10BaseT (20 Mbps) connection through the Twisted Pair port.


Twisted Pair - No Link Test
Establish a 10BaseT connection with no Link Integrity Test through the Twisted Pair port.

Select this option if the adapter is connected to a hub which does not generate link pulses to check the link integrity.


BNC
Establish a 10Base2 (Thinwire) connection through the BNC connector port.


10Mbps
Establish a 10BaseT connection through the 10Mbps port.


10 Mbps - Full Duplex
Establish a Full Duplex 10BaseT (20 Mbps) connection through the 10Mbps port.