When the adapter and cable is tested in wrap mode, the wrap is 
performed in the hub or concentrator, testing the adapter and 
all the cable between the adapter and the hub.

If you are using STP cable, you can disconnect the cable from 
the wall outlet and select Retest to exclude the wiring in the 
wall from the wrap test.
