The adapter has failed to communicate on the LAN.  The problem may
arise from faulty cabling, LAN operation problems, or the adapter.

Continue with the following steps to isolate the problem:

1.  Tell your network administrator that you are experiencing
problems, and ensure that the LAN is fully operational and that
you have access to it.

2. Select Retest to test the adapter and cable in wrap mode.
