Copyright: Copyright (c) 1993-95 Standard Microsystems Corp.


SMC 9000 Ethernet Adapter Setup

Use this dialog box to configure settings for the SMC9000 Ethernet adapter card.  For more information click on a field in the dialog box displayed below or press <TAB> to move to the field and then press <ENTER>...


IRQ Level

Select an interrupt level for this adapter card.  IRQ9 is the default setting.


I/O Port
I/O Base

Select an I/O Port for this adapter card.  0x0300 is the default setting.


Media Type

Select the media type for this adapter card.  Select 10BaseT to use the onboard transceiver.  Select AUI or BNC if these alternate modes of connection are used.  The default is 10BaseT.


Network Address

Select 12 hexadecimal digits.  The address must specify the "locally administered" bit on and the "group" bit off.  In other words, the two low order bits of the high-order byte must equal the value 0x02.  Each adapter on the network must have a unique network address.  The default value is the burned in address contained in the adapter EPROM.


Continue

Select Continue to save the values defined in the dialog box and exit.


Cancel

Select Cancel to exit leaving the current values unchanged.


Help

Select Help to display this file.


SMC 91C100 Fast Ethernet Adapter Setup

Use this dialog box to configure settings for the SMC 91C100 Fast Ethernet adapter card.  For more information click on a field in the dialog box displayed below or press <TAB> to move to the field and then press <ENTER>...


Adapter Speed

Select the speed at which the adapter operates.  The default is High Speed or 100mb.  If Low Speed is selected then the adapter will operate at 10mb.


Contents
SMC 9000 Ethernet Adapter Setup Help Contents

Select one of the topics below for more information on setting up a specific adapter.

SMC 9000 Ethernet Adapter Setup

SMC 91C100 Fast Ethernet Adapter Setup

SMC 91C100 Fast Ethernet Adapter Media Setup


SMC 91C100 Fast Ethernet Adapter Setup

Use this dialog box to configure media attachment settings for the SMC 91C100 Fast Ethernet adapter card in 10mb mode.  For more information click on a field in the dialog box displayed below or press <TAB> to move to the field and then press <ENTER>...