Clear Connections

Check the Clear Connections check box to clear all of the Novell Client connections before attempting to login.


No Help Available
There is no help available for this item.


Server

Specifies a server connection.

In the available field, type the desired server name (do not include a context in the name) or click [image] to get a list of available servers.

If you choose the Server option, you are connected to the specified server.


Server Button

Provides a list of available servers. Click a server in the list to enter it in the Server field.