Novell Help Librarian Data File Version 1.00
COPYRIGHT (c) 1985 by Novell, Inc.  All Rights Reserved.
#·!å≤╨ïaV∩ ú#╨&z1╞6l9∩;╡<î>ε?▌@
BÄEëG½NWEX╫Zé]_╟a»deij≡k╗m
p╩20, NetWare/IP Server Administration Help   1 of 2
════════════════════════════════════════════════  This menu displays a list of options
 associated with configuring and starting a
 NetWare/IP server. DSS and DNS servers must
 be configured and running before you can start
 the NetWare/IP server. This menu contains the
 following options:

 Configure DNS Client
     Set up DNS access on this server. The
     server must be set up to access DNS before
     it can be configured as a NetWare/IP
     server.

 <Esc>=Exit Help                    <PgDn>=Nextå20 NetWare/IP Server Administration Help   2 of 2
════════════════════════════════════════════════  Configure NetWare/IP Server
     Configure this server as a NetWare/IP
     server for a specified NetWare/IP domain.
     Use this option to set up or modify the
     NetWare/IP configuration information on
     the current server.

 Start NetWare/IP Server
     Launch the NetWare/IP server component on
     this server. Make sure DSS and DNS servers
     are configured and running before you
     launch the NetWare/IP server.|
64q NetWare/IP Server Configuration Help   Help 1 of 4
════════════════════════════════════════════════════  Use this form to configure this host as a
 NetWare/IP server or to modify the NetWare/IP
 server configuration. This form  contains the
 following fields:

 NetWare/IP Domain
     The name of the NetWare/IP domain to which
     this server belongs. All NetWare/IP servers
     and clients using the same primary DSS server
     must belong to the same NetWare/IP domain.
     NetWare/IP domain names must follow the same
     naming conventions as DNS domain names.


 <Esc>=Exit Help                        <PgDn>=Nextµ	≤
64R NetWare/IP Server Configuration Help   Help 2 of 4
════════════════════════════════════════════════════  Preferred DSSes
     Press <Enter> in this field to display the
     Preferred DSSes form. You can use the
     Preferred DSSes form to view, add to, or
     modify the preferred DSS server list for
     this NetWare/IP server.

 Initial DSS Contact Retries
     The number of times this NetWare/IP server
     will retransmit an unacknowledged query to a
     given DSS server at startup. The default is 1
     in a range of 0 to 50.


 <Esc>=Exit Help                        <PgDn>=Nextæ|
64ô NetWare/IP Server Configuration Help   Help 3 of 4
════════════════════════════════════════════════════  Retry Interval
     The length of time in seconds this NetWare/IP
     server will wait before retransmitting an
     unacknowledged query to a given DSS server at
     startup. The default is 10 seconds in a range
     of 5 to 100 seconds.


  Timeout value for NWIP Read/Write
     The length of time in seconds this NetWare/IP 
     server will wait before concluding that a TCP 
     socket is not ready for Reading or Writing. 
     The default is 15 seconds in a range of 5 to 
     500 seconds

 <Esc>=Exit Help                        <PgDn>=Nextµ	
64' NetWare/IP Server Configuration Help   Help 4 of 4
════════════════════════════════════════════════════ Slow Link Customizations
     Press <Enter> in this field to display the
     Remote Access Via Slow Links form. You can use
     the Remote Access Via Slow Links form to view,
     add to, or modify slow link customization
     values.


  Forward IPX Information to DSS
     Specifies whether this NetWare/IP server
     should act as a forwarding gateway. A
     forwarding gateway connects IP and IPX
     network segments. The default is No.20ú Preferred DSS Help                 Help 1 of 1
════════════════════════════════════════════════  Use this form to specify the hostname, IP
 address, or network IP address of up to five
 DSS servers that are closest to this server.

 The NetWare/IP server will attempt to register
 with the DSS servers on this list before
 querying a DNS name server for a list of
 available DSS servers.

 This parameter is optional.
L20⌐ Primary DSS Configuration Help     Help 1 of 4
════════════════════════════════════════════════  Use this form to set up a NetWare server as a
 primary DSS server and configure the global
 parameters for a specified NetWare/IP domain.
 You can also use this form to modify the
 primary DSS server configuration.

 A single primary DSS server must be configured
 per NetWare/IP domain for NetWare/IP to
 function. Once configured, the primary DSS
 server handles SAP/RIP requests and database
 replication automatically. It is recommended
 that a server that has relatively low
 utilization be designated as the primary DSS
 server.

 <Esc>=Exit Help                    <PgDn>=Nextïï20' Primary DSS Configuration Help     Help 2 of 4
════════════════════════════════════════════════  This form contains the following fields:

 NetWare/IP Domain
     The fully-qualified name of the
     NetWare/IP domain to which this primary
     DSS server belongs. The NetWare/IP domain
     name must conform to the same naming
     conventions as DNS domain names.
     
 Primary DSS Host Name
     The fully qualified hostname of the
     server you are configuring as the
     primary DSS server.


 <Esc>=Exit Help                    <PgDn>=NextL20] Primary DSS Configuration Help     Help 3 of 4
════════════════════════════════════════════════  IPX Network Number (in hex)
     The IPX external network number for your
     NetWare/IP network. You can assign an
     arbitrary hexadecimal number, one to eight
     digits (1 to FFFFFFFF), but the number
     must be unique throughout your IPX
     internetwork.

 Tunable Parameters
     Press <Enter> in this field to display
     the Tunable Parameters form. You can view
     and modify the tunable parameters from the
     Tunable Parameters form.


 <Esc>=Exit Help                    <PgDn>=Nextï20I Primary DSS Configuration Help     Help 4 of 4
════════════════════════════════════════════════  DSS SAP Filters
     Press <Enter> in this field to enable and
     define DSS SAP filtering. DSS SAP filters,
     when applied, allow only SAP traffic that
     meets specified criteria to be replicated
     to other DSS servers.■20à Secondary DSS Configuration Help   Help 1 of 2
════════════════════════════════════════════════  Use this form to configure a secondary
 DSS server or to modify the secondary DSS
 server configuration. You must configure a
 primary DSS server for the NetWare/IP domain
 before you can configure a secondary DSS
 server.

 This form contains the following fields:

 NetWare/IP Domain
     The name of the NetWare/IP domain for
     which this DSS server maintains SAP and
     RIP information. The NetWare/IP domain
     name must conform to the same naming
     conventions as DNS domain names. 

 <Esc>=Exit Help                    <PgDn>=Nexta20@ Secondary DSS Configuration Help   Help 2 of 2
════════════════════════════════════════════════  Primary DSS Hostname
     The fully qualified hostname or IP address
     of the primary DSS server. A fully
     qualified hostname is a hostname, such as
     hostname.domain.com., that ends with a
     dot (.) for root.520╟ Slow Links Help                    Help 1 of 2
════════════════════════════════════════════════  Use this form to assign customized tick
 values to slow links between this NetWare/IP
 server and up to five remote NetWare/IP
 servers or networks. This form contains the
 following fields:

 Network/Host IP Address
     The hostname, IP address, or subnetwork
     address of the remote server or network.


 <Esc>=Exit Help                    <PgDn>=NextV20ó Slow Links Help                    Help 1 of 2
════════════════════════════════════════════════  Tick Value
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one way
     between this NetWare/IP server and the
     remote server or network.

 This parameter is optional and is helpful
 only if your client systems are timing
 out when trying to access services over
 specific slow links.q#20j Function Key Help                  Help 1 of 1
════════════════════════════════════════════════  <Esc>        Back up to the previous level
 <F10>        Exit the program
 <Insert>     Insert a new item
 <Delete>     Delete an item
 <Enter>      Accept information entered
 <F1>         Provide on-line help
 <F3>         Rename an item in a list
 <F5>         Mark an item in a list
 <Shift-F7>   Mark an entire list
 <F7>         Unmark selected items in list
 <PgDn>       Scroll down the contents in the
              current window
 <PgUp>       Scroll up the current contents
              in the current window∩  Press <ESC> to continue. k%20░ DNS Client Help                    Help 1 of 2
════════════════════════════════════════════════  Use this form to set up DNS access on this
 server. The server must be set up to access
 DNS before it can be configured as a
 NetWare/IP server.

 This form contains the following fields:

 DNS Domain
     The fully qualified name of the DNS domain      to which this server belongs.

 <Esc>=Exit Help                    <PgDn>=Next
ú#20M DNS Client Help                    Help 2 of 2
════════════════════════════════════════════════  Name Server
     The hostname or IP address of the first
     name server this server should contact
     to resolve DNS queries.
 
 Use the additional Name Server fields to
 identify secondary and tertiary name servers,
 if necessary.·)20 Tunable Parameters Help            Help 1 of 4
════════════════════════════════════════════════  Use this form to view and modify the
 primary DSS server tunable parameters. The
 tunable parameters are part of the global
 parameters that are downloaded to all
 secondary DSS servers, NetWare/IP servers, and
 NetWare/IP clients. This form contains the
 following fields:

 UDP Port Number for NetWare/IP Service
     The port numbers assigned for NetWare/IP
     service. The configuration process assigns
     two consecutive ports. The default is
     43981 and 43982 in a range of 1 to 65535.
     If either of the default port numbers is
     already in use on your network, you must
     assign an alternative series of ports.
     
 <Esc>=Exit Help                    <PgDn>=Next¼,╨&20Ü Tunable Parameters Help            Help 2 of 4
════════════════════════════════════════════════  DSS-Netware/IP Server Synchronization Interval
     This parameter specifies how often a
     the NetWare/IP servers in this NetWare/IP
     domain query DSS for updated information.
     The default is 5 minutes in a range of 1
     to 60 minutes.

 Primary-Secondary DSS Synchronization Interval
     This parameter specifies how often
     secondary DSS servers in this NetWare/IP
     domain query the primary DSS server for
     updated information. The default is 5
     minutes in a range of 1 to 240 minutes.




 <Esc>=Exit Help                    <PgDn>=Nextµ.·)20" Tunable Parameters Help            Help 3 of 4
════════════════════════════════════════════════  Maximum UDP Transmissions
     This parameter specifies how often an
     unacknowledged packet is resent before it
     is dropped. The default is 3 times in a
     range of 1 to 48.

 UDP Checksum?
     This parameter specifies whether
     transmitted information should be checked 
     for errors. The default is No, which
     enables UDP to provide its fastest
     transmission service.




 
 <Esc>=Exit Help                    <PgDn>=Next¼,20| Tunable Parameters Help            Help 4 of 4
════════════════════════════════════════════════  Ticks between Nodes on the Same IP Subnet
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one way
     between two nodes on the same IP subnet.

 Ticks between Nodes on the Same IP Net
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one way
     between two nodes on the same IP network.

 Ticks between Nodes on Different IP Nets
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one way
     between two nodes on different IP
     networks.

K431╣ Browse DSS Database Help            Help 1 of 2
═════════════════════════════════════════════════  This menu displays a list of options for
 viewing the SAP or RIP records stored in the
 DSS database. You can browse the DSS database
 only if the current server is configured as
 a primary or secondary DSS server. You might
 want to view SAP or RIP records while
 troubleshooting a NetWare/IP network.

 This menu includes the following options:

 Look At SAP Records
     Use this option to view SAP records stored
     in the DSS database on this server. When
     you select this option, the utility
     displays a menu of SAP display options.

 <Esc>=Exit Help                    <PgDn>=Nextz131c Browse DSS Database Help            Help 2 of 2
═════════════════════════════════════════════════  Look At RIP Records
     Use this option to view RIP records stored
     in the DSS database on this server. When
     you select this option, the utility
     displays a menu of RIP display options.

 Save SAP Database To Text File
     Use this option to save all SAP records
     stored in the DSS database on this server
     to a specified text file.

 Save RIP Database To Text File
     Use this option to save all RIP records
     stored in the DSS database on this server
     to a specified text file.20Ä SAP Display Criterion Help         Help 1 of 1
════════════════════════════════════════════════  This menu displays a list of SAP display
 options. These options provide criteria for
 filtering SAP records from the DSS database.
 This menu contains the following options:

 Display Records for a Given SAP Type
     Use this option to display all SAP records
     originating from a specific server type.

 Display Records for a Given Server
     Use this option to display all SAP records
     originating from a specific server name.

 Display All Records
     Use this option to display all SAP records
     stored in the DSS database on this server.31k RIP Display Criterion Help          Help 1 of 1
═════════════════════════════════════════════════  This menu displays a list of RIP display
 options. These options provide criteria for
 filtering RIP records from the DSS database.
 This menu contains the following options:

 Display Records for a Given IPX Network
     Use this option to display all RIP records
     originating from a specified IPX network.
     When you select this option, the utility
     prompts you for an IPX network number.

 Display All Records
     Use this option to display all RIP records
     stored in the DSS database on this server.31« Save Database To Text File Help     Help 1 of 1
═════════════════════════════════════════════════  Enter the full path of the file in which to
 save the SAP or RIP database.20┐ Select SAP Type Help               Help 1 of 1
════════════════════════════════════════════════  This screen displays a list of SAP types
 to be used as selection criteria for viewing
 SAP records. To display all SAP records of a
 specific SAP type, select the SAP type from
 the list. 

 If the type of SAP you want to display records
 for is not listed on this screen, select OTHER
 TYPE from the list. The utility then prompts
 for a SAP type.2	0J SAP Type Help                      Help 1 of 1
════════════════════════════════════════════════  Enter the SAP ID that corresponds to the
 type of service for which you want to view
 SAP records.

 A SAP ID is a two-byte integer (in hex) that
 represents a specific service. For example,
 the SAP ID for a file server is 0x0004.

1/╫ Server Name Help                  Help 1 of 1
═══════════════════════════════════════════════  Enter name of the server for which you want
 to view SAP records. A valid server name can
 be from 1 to 48 characters.
		20 IPX Network Number Help            Help 1 of 1
════════════════════════════════════════════════  Enter the IPX network number of the network
 for which you want to display RIP records.

 An IPX network number is a hexadecimal number
 that is one to eight digits (1 to FFFFFFFF).
╪C20│ SAP Display Help                   Help 1 of 2
════════════════════════════════════════════════  This screen displays a list of all SAP
 records meeting the display criteria you
 selected. This screen contains the following
 information about each SAP entry:

 Server
     The name of the server from which the SAP
     originated.

 SAP ID 
     A code specifying the type of service.

 <Esc>=Exit Help                    <PgDn>=Next
B20₧ SAP Display Help                   Help 2 of 2
════════════════════════════════════════════════  Sources 
     The number of servers that reported the
     service.  

 Scope
     Indicates whether or not this SAP
     information is replicated -- "G" for
     global/replicated or blank for local/
     non-replicated.

 Select a specific SAP entry to see more
 information about the SAP record and its
 sources.20π RIP Display Help                   Help 1 of 1
════════════════════════════════════════════════  This screen displays a listing of all RIP
 records meeting the display criteria you
 selected. This screen contains the following
 information about each RIP entry:

 Network Number
     The IPX network number of the RIP record.

 Known Routes
     The number of sources reporting the route. 
 Select a specific RIP entry to see more
 information about the RIP record and its
 sources.╠I20+ RIP Detail Help                    Help 1 of 3
════════════════════════════════════════════════  This screen displays detailed information
 about a specific RIP record. This screen
 contains the following fields:

 IPX Network Number
     The IPX network number of the remote
     network.

 Reporting NetWare/IP Server
     The IP address of the NetWare/IP server
     that reported the RIP to DSS.

 Reporting Server's Subnet
     The subnetwork address of the server that
     reported the RIP to DSS.

 <Esc>=Exit Help                    <PgDn>=Next CLëG20_ RIP Detail Help                    Help 2 of 3
════════════════════════════════════════════════  Time To Live
     The number of database synchronizations
     after which this RIP will be marked for
     deletion unless its status is updated. 

 Number of Hops
     The number of hops between a server on the
     remote network and the server that
     reported the route to DSS. If the value
     in this field is zero, the remote network
     is a TCP/IP network. If the value in this
     field is non-zero, the remote network is
     an IPX network.



 <Esc>=Exit Help                    <PgDn>=Next╠I20P RIP Detail Help                    Help 3 of 3
════════════════════════════════════════════════  Number of Ticks
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one way
     between a server on the remote network
     and the server that reported the route to
     DSS.

 Responsible DSS
     The DSS server to which the route was
     first reported. The value in this field is
     either "this dss" or the IP address of
     another DSS server.

 DSS Database Flag
     A code specifying information about the
     RIP. This code is used internally by DSS.│P20≡ SAP Detail Help                    Help 1 of 4
════════════════════════════════════════════════  This screen displays detailed information
 about a specific SAP record. This screen
 contains the following fields:

 Server Name
     The name of the server providing the
     advertised service.

 SAP ID
     A code specifying the type of service
     being advertised. For example, a SAP
     advertising a file server is a type 0x0004
     SAP.


 <Esc>=Exit Help                    <PgDn>=Next╠R½N20 SAP Detail Help                    Help 2 of 4
════════════════════════════════════════════════  IPX Address
     A three-part address specifying the IPX
     address, node number, and socket number
     where the advertised service is available.

 Reporting NetWare/IP Server
     The IP address of the NetWare/IP server
     that reported the SAP to DSS.

 Reporting Server's Subnet
     The subnetwork address of the server that
     reported the SAP to DSS.



 <Esc>=Exit Help                    <PgDn>=NexttU│P20É SAP Detail Help                    Help 3 of 4 ════════════════════════════════════════════════  Time To Live
     The number of database synchronizations
     after which this SAP will be marked for
     deletion unless its status is updated.

 Number of Hops
     The number of hops between the server
     providing the service and the server
     advertising the service to DSS. If the
     value in this field is zero, the
     advertised service resides on a NetWare/IP
     server. If the value in this field is
     non-zero, the advertised service resides
     on an IPX-based NetWare server.
    
 <Esc>=Exit Help                    <PgDn>=Next ╠R20â SAP Detail Help                    Help 4 of 4
════════════════════════════════════════════════  Responsible DSS
     The DSS server to which the service was
     first reported. The value in this field is
     either "this dss" or the IP address of
     another DSS server.

 DSS Database Flag
     A code specifying information about the
     SAP. This code is used internally by DSS.		20 NetWare/IP Domain Name Help        Help 1 of 1
════════════════════════════════════════════════  Enter the fully qualified name of the
 NetWare/IP domain for which you want to
 display a DSS server list. NetWare/IP
 domain names follow the same naming
 conventions as DNS domain names.31z Display DSSes Help                  Help 1 of 1 ═════════════════════════════════════════════════  This screen displays a list of all known DSS
 servers for a specified NetWare/IP domain. The
 utility obtains this list by querying DNS and
 DSS servers. 

 For each DSS server entry, the utility displays
 the name or IP address of the DSS server, the
 DSS server type (primary or secondary), whether
 or not the DSS server is registered with a DNS
 name server, and the DSS server status (active
 or inactive).

 The information displayed on this screen may be
 incomplete if any or all of the DSS or DNS
 servers are not responding.20ô                   WARNING! 
════════════════════════════════════════════════  You have successfully installed the
 NetWare/IP software! You must now continue
 to configure and load the NetWare/IP server if
 one of the following is true:
 
 1. This machine uses IP as the transport to
    synchronize with other Directory replicas.

 2. You are installing a new server and you
    want to use NetWare/IP as the transport
    protocol to access the Directory tree.

 Before loading the NetWare/IP server, make
 sure DNS and DSS servers are running. The
 DNS server can reside on a non-NetWare
 machine. You must configure DNS before you
 can run a DSS server.
	
31h                        Note
═════════════════════════════════════════════════  The NetWare/IP Configuration utility detected
 that NetWare/IP is already configured on this
 machine. Make any necessary changes before
 starting the NetWare/IP server. Before starting
 the NetWare/IP server, you must also make sure
 that DNS and DSS servers are up and running.
20¡                   WARNING! 
════════════════════════════════════════════════  The NetWare/IP server component has not yet
 been configured on this machine. You must
 configure and load the NetWare/IP server now
 for this machine to access network resources
 that are part of this NetWare/IP network. DNS
 and DSS servers must be running on the network
 before you can configure this server as a
 NetWare/IP server.

 If NDS is already installed and accessible
 through a transport other than IP, you can
 exit now and use UNICON to configure the
 NetWare/IP components later. If you cannot log
 in to UNICON, you can use NWIPCFG to configure
 and load the NetWare/IP server component.20╨                   WARNING! 
════════════════════════════════════════════════  The NetWare/IP server has not loaded yet.
 You must load the NetWare/IP server for this
 machine to access network resources that are
 part of the NetWare/IP network. DNS and DSS
 servers must be running on the network before
 you can launch the NetWare/IP server.

 If the NetWare/IP server failed to load, make
 sure the DNS and DSS servers are operating
 correctly before trying to launch the
 NetWare/IP server again.

 If NDS is already installed, you can exit now
 and use UNICON to configure the NetWare/IP
 components later. If you cannot log in to
 UNICON, you can use NWIPCFG to configure and
 load the NetWare/IP server component.;g20t                   WARNING! 
════════════════════════════════════════════════  The NetWare/IP server failed to load. The
 NetWare/IP server may have failed for one or
 more of the following reasons:

 1. DNS is not loaded or is not reachable.

 2. You did not add name server (NS) resource
    records for the DSS servers in the
    NetWare/IP domain to the DNS database.

 3. The NS records that the DNS server returned
    do not point to DSS servers. In this case,
    you must reconfigure DNS so that the NS
    records for the NetWare/IP domain point to
    the DSS servers.

 <Esc>=Exit Help                    <PgDn>=Next»d20                   WARNING! 
════════════════════════════════════════════════  4. The DSS servers that this server attempted
    to communicate with are either down or
    unreachable.

 The status message displayed by NWIPCFG
 indicates why the NetWare/IP server cannot
 load. Make the necessary correction before
 attempting to load the NetWare/IP server
 again. If this machine is meant to be a DSS
 server, you need to exit now and configure it
 using UNICON. You should configure a DNS
 server before running the DSS server.

53à The NetWare/IP server loaded successfully. This
 machine can now access network resources that are
 part of this NetWare/IP network.20╓ Use NetWare/IP Configuration?      Help 1 of 1
════════════════════════════════════════════════  When you select the "Configure NetWare/IP
 Server" option, UNICON issues a DHCP request
 for NetWare/IP and DSS information. If a DHCP
 server responds, you are prompted to confirm
 the NetWare/IP domain name and the primary DSS
 server name.

 Unless this NetWare/IP server is to be part of
 a different NetWare/IP domain, confirm the
 values returned by the DHCP server.20│ DNS Access Not Configured Help     Help 1 of 1
════════════════════════════════════════════════  To run NetWare/IP on a server, the server
 must be configured as a DNS client.

 To configure this server as a DNS client, you
 need to know the following:

 1. The DNS domain name to which the server
    belongs.

 2. The hostname(s) or IP address(es) of the
    DNS name server(s) this server should
    contact to resolve DNS queries.207 Use DSS Configuration?             Help 1 of 1
════════════════════════════════════════════════  When you select the "Configure Secondary DSS"
 option, UNICON issues a DHCP request for DSS
 and NetWare/IP information. If a DHCP server
 responds, you are prompted to confirm the
 primary DSS server name and NetWare/IP domain
 name for the NetWare/IP domain that is
 serviced by that primary DSS server.

 Unless this secondary DSS server is to
 communicate with a different primary DSS
 server and NetWare/IP domain, confirm the
 values returned by the DHCP server.
≤q31╤ IPX Networks Detected Help          Help 1 of 2
═════════════════════════════════════════════════  The NetWare/IP configuration utility has
 detected that this server is bound to one or
 more IPX networks and that the NetWare/IP
 service is not configured as a forwarding
 gateway.

 If you want to make IPX services and routes
 available to IP-based hosts, you need to
 configure a server as a forwarding gateway.


 <Esc>=Exit Help                    <PgDn>=Next
p31╕ IPX Networks Detected Help          Help 2 of 2
═════════════════════════════════════════════════  To configure a server as a forwarding gateway,
 complete the following steps:

 1. Make sure IPX is correctly bound to a
    network board and that IPXRTR is loaded
    without the "routing=none" parameter.

 2. On the NetWare/IP Server Configuration form,
    select YES in the "Forward IPX Information
    to DSS" field.

 <Esc>=Exit Help