Novell Help Librarian Data File Version 1.00
COPYRIGHT (c) 1985 by Novell, Inc.  All Rights Reserved.
#·v▒
╡v#▒&e)á,δ9e?BôDYE-GéHtIÑJöMöO╧VG_ü`+cⁿgck╖k
ldl╥31D NetWare/IP Administration Help      Help 1 of 4
═════════════════════════════════════════════════  This menu displays a list of options
 associated with configuring and managing a
 primary DSS server, secondary DSS server, or
 NetWare/IP server. This menu contains the
 following options:

 Configure NetWare/IP Server
     Configure this server as a NetWare/IP            server for a specified NetWare/IP domain.
     Use this option to set up or modify the
     NetWare/IP configuration information on
     the current server.


 <Esc>=Exit Help                    <PgDn>=Nextüv20ù NetWare/IP Administration Help     Help 2 of 4
════════════════════════════════════════════════  Delete NetWare/IP Configuration
     Remove all NetWare/IP configuration             information from the current server. Use
     this option to deconfigure the NetWare/IP
     server component on this machine.
     
 Configure Primary DSS
     Configure this server as the primary DSS 
     server for a specified NetWare/IP domain.
     Use this option to set up or modify the
     global configuration parameters for a
     NetWare/IP domain. You must configure one
     primary DSS server per NetWare/IP domain.

 <Esc>=Exit Help                    <PgDn>=Next╥20x NetWare/IP Administration Help     Help 3 of 4
════════════════════════════════════════════════ Configure Secondary DSS
     Configure this server as a secondary DSS 
     server. Use this option to set up or 
     modify the secondary DSS server
     configuration on the current server. 

 Delete DSS Configuration
     Remove all DSS configuration information
     from this server. Use this option to 
     deconfigure the primary or secondary DSS
     server configuration on the current server
     or to change the DSS server from a primary
     to a secondary or vice versa.

 <Esc>=Exit Help                    <PgDn>=Nextü20ê NetWare/IP Administration Help     Help 4 of 4
════════════════════════════════════════════════  Browse DSS Database
     Display selected SAP or RIP records stored      in the DSS database on this server. Use         this option to view selected SAP or RIP         records or to save the contents of the SAP      or RIP database to a text file. DSS must        be configured on this server in order to        use this option.

 Display All DSSes
     Display a list of all known DSS servers in
     a specified NetWare/IP domain. Use this 
     option to view the name, type, and status
     of all DSS servers in a given NetWare/IP
     domain.
2

64i NetWare/IP Server Configuration Help   Help 1 of 4
════════════════════════════════════════════════════  Use this form to configure this host as a
 NetWare/IP server or to modify the NetWare/IP
 server configuration. This form  contains the
 following fields:

 NetWare/IP Domain
     The name of the NetWare/IP domain to which
     this server belongs. All NetWare/IP servers
     and clients using the same primary DSS server
     must belong to the same NetWare/IP domain. 
     NetWare/IP domain names follow the same
     naming conventions as DNS domain names.


 <Esc>=Exit Help                    <PgDn>=NextÜ▒

64P NetWare/IP Server Configuration Help   Help 2 of 4
════════════════════════════════════════════════════  Preferred DSSes
     Pressing <Enter> in this field displays the
     Preferred DSSes form. You can use the
     Preferred DSSes form to view, add, or modify
     the preferred DSS server listing for this
     NetWare/IP server.

 Initial DSS Contact Retries
     The number of times this NetWare/IP server
     will retransmit an unacknowledged query to a
     given DSS server at startup. The default is 1
     in a range of 0 to 50.


 <Esc>=Exit Help                    <PgDn>=Next
E2

64ô NetWare/IP Server Configuration Help   Help 3 of 4
════════════════════════════════════════════════════  Retry Interval
     The length of time in seconds this NetWare/IP
     server will wait before retransmitting an
     unacknowledged query to a given DSS server at
     startup. The default is 10 seconds in a range
     of 5 to 100 seconds.

  Timeout value for NWIP Read/Write:
     The length of time in seconds this NetWare/IP 
     server will wait before concluding that a TCP 
     socket is not ready for Reading or Writing.  
     The default is 15 seconds in a range of 5 to 
     500 seconds.


 <Esc>=Exit Help                    <PgDn>=Next
Ü
64X NetWare/IP Server Configuration Help   Help 4 of 4
════════════════════════════════════════════════════ 
  Slow Link Customizations
     Pressing <Enter> in this field displays the
     Remote Access Via Slow Links form. You can use
     the Remote Access Via Slow Links form to view,
     add, or modify slow link customization values.


  Forward IPX Information to DSS
     Specifies whether this NetWare/IP server
     should act as a forwarding gateway. A 
     forwarding gateway connects IP and IPX network
     segments. The default is no.




 <Esc>=Exit Help                    <PgDn>=Next
31⌐   Preferred DSS Help                Help 1 of 1
═════════════════════════════════════════════════  Use this form to specify the hostname, IP
 address, or network IP address of up to five
 DSS servers that are closest to this server.
 The NetWare/IP server will attempt to register
 with the DSS servers on this listing before
 querying a DNS name server for a listing of
 available DSS servers. This parameter is
 optional.
120ú Primary DSS Configuration Help     Help 1 of 4
════════════════════════════════════════════════  Use this form to set up a NetWare server as a
 primary DSS server and configure the global
 parameters for a specified NetWare/IP domain.
 You can also use this form to modify the
 primary DSS server configuration. 

 A single primary DSS server must be configured
 per NetWare/IP domain for NetWare/IP to
 function. Once configured, the primary DSS
 server handles SAP/RIP requests and database
 replication automatically. It is recommended
 that a server that has relatively low
 utilization be designated primary DSS server.


 <Esc>=Exit Help                    <PgDn>=Next~v205 Primary DSS Configuration Help     Help 2 of 4
════════════════════════════════════════════════  This form contains the following fields:

 NetWare/IP Domain
     The fully qualified name of the
     NetWare/IP domain to which this primary
     DSS server belongs. The NetWare/IP domain
     name conforms to the same naming                conventions as DNS domain names.
     
 Primary DSS Host Name
     The fully qualified hostname of the             server you are configuring as the primary
     DSS server. 


 <Esc>=Exit Help                    <PgDn>=Next⌠120^ Primary DSS Configuration Help     Help 3 of 4
════════════════════════════════════════════════  IPX Network Number (in hex)
     The IPX external network number for your
     NetWare/IP network. You can assign an
     arbitrary hexadecimal number, one to eight
     digits (1 to FFFFFFFF), but the number
     must be unique throughout your IPX
     internetwork.

 Tunable Parameters
     Pressing <Enter> in this field displays
     the Tunable Parameters list. You can view
     and modify the tunable parameters from the
     Tunable Parameters list.


 <Esc>=Exit Help                    <PgDn>=Next~20 Primary DSS Configuration Help     Help 4 of 4
════════════════════════════════════════════════  DSS SAP Filters
     Pressing <Enter> in this field allows you
     to view/configure/modify SAP filtering by
     all DSSes for the entire NetWare/IP
     network.
     ¡!20} Secondary DSS Configuration Help   Help 1 of 2
════════════════════════════════════════════════  Use this form to configure a secondary
 DSS server or to modify the secondary DSS
 server configuration. You must configure a
 primary DSS server for the NetWare/IP domain
 before you can configure a secondary DSS
 server.

 This form contains the following fields:

 NetWare/IP Domain
     The name of NetWare/IP domain for which 
     this DSS server maintains SAP and RIP
     information. The NetWare/IP domain
     name conforms to the same naming
     conventions as DNS domain names. 

<Esc>=Exit Help                    <PgDn>=Next20@ Secondary DSS Configuration Help   Help 2 of 2
═══════════════════════════════════════════════   Primary DSS Hostname
     The fully qualified hostname or IP address
     of the primary DSS server. A fully
     qualified hostname is a hostname, such as
     hostname.domain.com., that ends with a
     dot (.) for root.ò%31x Slow Links Help                     Help 1 of 2
═════════════════════════════════════════════════  Use this form to assign customized tick values
 to slow links between this NetWare/IP server
 and up to five remote NetWare/IP servers or
 networks. This form contains the following
 fields:

 Network/Host IP Address
     The hostname, IP address, or subnetwork
     address of the remote server or network.

 Tick Value
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one-way between
     this NetWare/IP server and the remote
     server or network.

 <Esc>=Exit Help                    <PgDn>=Next#20 Slow Links Help                    Help 1 of 2
════════════════════════════════════════════════  This parameter is optional and will only be
 needed if you find that your client systems
 are timing out when trying to access services
 over specific slow links.3)20j Function Key Help                  Help 1 of 1
════════════════════════════════════════════════  <Esc>        Back up to the previous level
 <F10>        Exit the program
 <Insert>     Insert a new item
 <Delete>     Delete an item
 <Enter>      Accept information entered
 <F1>         Provide on-line help
 <F3>         Rename an item in a list
 <F5>         Mark an item in a list
 <Shift-F7>   Mark an entire list
 <F7>         Unmark selected items in list
 <PgDn>       Scroll down the contents in the
              current window
 <PgUp>       Scroll up the current contents
              in the current window▒& Press <ESC> to continue. 4+20╖ DNS Client Help                    Help 1 of 2
════════════════════════════════════════════════  Use this form to set up DNS access on this
 server. The server must be set up to access
 DNS before it can be configured as a DSS or
 NetWare/IP server.

 This form contains the following fields:

 DNS Domain
     The fully qualified name of the DNS domain      to which this server belongs.


 <Esc>=Exit Help                    <PgDn>=Nexte)20T DNS Client Help                    Help 2 of 2
════════════════════════════════════════════════  Name Server
     The hostname or IP address of the first         name server this server should contact          to resolve DNS queries.
 
 Use the additional Name Server fields to
 identify secondary and tertiary name servers,
 if necessary.╩/20 Tunable Parameters Help            Help 1 of 5
════════════════════════════════════════════════  Use this form to view and modify the
 primary DSS server tunable parameters. The
 tunable parameters are part of the global
 parameters that are downloaded to all
 secondary DSS servers, NetWare/IP servers, and
 NetWare/IP clients. This form contains the
 following fields:

 UDP Port Number for NetWare/IP Service
     The port numbers assigned for NetWare/IP
     service. The configuration process assigns
     two consecutive ports. The default is
     43981 and 43982 in a range of 1 to 65535.
     If either of the default port numbers is
     already in use on your network, you must
     assign an alternative series of ports.
     
 <Esc>=Exit Help                    <PgDn>=NextÇ2á,20₧ Tunable Parameters Help            Help 2 of 5
════════════════════════════════════════════════  DSS-Netware/IP Server Synchronization Interval
     This parameter specifies how often a
     the NetWare/IP servers in this NetWare/IP
     domain query the DSS for updated 
     information. The default is 5 minutes in a
     range of 1 to 60 minutes.

 Primary-Secondary DSS Synchronization Interval
     This parameter specifies how often
     Secondary DSS servers in this NetWare/IP
     domain query the primary DSS server for
     updated information. The default is 5
     minutes in a range of 1 to 240 minutes.




<Esc>=Exit Help                    <PgDn>=Next╘4╩/20<Tunable Parameters Help            Help 3 of 5
════════════════════════════════════════════════ Maximum UDP Transmissions
     This parameter specifies how often an
     unacknowledged packet is resent before it
     is dropped. The default is 3 times in a
     range of 1 to 48.

 Maximum number of UDP packets
     This parameter specifies the maximum size 
     of the UDP packet queue for storing SAP 
     and RIP information during database 
     synchronization. The default is 64 in a 
     range of 64 to 1024.

 



<Esc>=Exit Help                    <PgDn>=Next*7Ç220>Tunable Parameters Help            Help 4 of 5
════════════════════════════════════════════════
 Maximum number of TCP connections
     This parameter specifies the maximum 
     number of TCP connections maintained by 
     DSS for doing database synchronization. 
     The default is 16 in a range of 16 to 64.

 UDP Checksum?
     This parameter specifies whether
     transmitted information should be checked 
     for errors. The default is No, which
     enables UDP to provide its fastest
     transmission service.




<Esc>=Exit Help                    <PgDn>=Next╘420⌐Tunable Parameters Help            Help 5 of 5
════════════════════════════════════════════════ Ticks between Nodes on the Same IP Subnet
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one-way
     between two nodes on the same IP subnet.


 Ticks between Nodes on the Same IP Net
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one-way
     between two nodes on the same IP network.

 Ticks between Nodes on Different IP Nets
     The amount of time in ticks (1/18 second)
     it takes a packet to travel one-way
     between two nodes on different IP
     networks.

<Esc>=Exit Help                    <PgDn>=Nextσ<31Γ Browse DSS Database Help            Help 1 of 2
═════════════════════════════════════════════════  This menu displays a list of options for
 viewing the SAP or RIP records stored in the     DSS database. You can only browse the DSS
 database if the current server is configured as
 a primary or secondary DSS server. You may want
 to view SAP or RIP records to help you
 troubleshoot your NetWare/IP network.

 You can select one of the following options      from this menu:

 Look At SAP Records
     Use this option to view SAP records stored       in the DSS database on this server. When         you select this option, the utility       
     displays a menu of SAP display options.

 <Esc>=Exit Help                    <PgDn>=Nextδ931h Browse DSS Database Help            Help 2 of 2
═════════════════════════════════════════════════  Look At RIP Records
     Use this option to view RIP records stored       in the DSS database on this server. When
     you select this option, the utility 
     displays a menu of RIP display options.

 Save SAP Database To Text File
     Use this option to save all SAP records 
     stored in the DSS database on this server
     to a specified text file.

 Save RIP Database To Text File
     Use this option to save all RIP records
     stored in the DSS database on this server        to a specified text file.31æ SAP Display Criterion Help          Help 1 of 1
═════════════════════════════════════════════════  This menu displays a list of SAP display
 options. These options provide criterion for
 filtering SAP records from the DSS database.
 This menu contains the following options:

 Display Records for a Given SAP Type
     Use this option to display all SAP records
     originating from a specific server type.

 Display Records for a Given Server
     Use this option to display all SAP records
     originating from a specific server name.

 Display All Records
     Use this option to display all SAP records
     stored in the DSS database on this server.31m RIP Display Criterion Help          Help 1 of 1
═════════════════════════════════════════════════  This menu displays a list of RIP display
 options. These options provide criterion for
 filtering RIP records from the DSS database.
 This menu contains the following options:

 Display Records for a Given IPX Network
     Use this option to display all RIP records
     originating from a specified IPX network.
     When you select this option, the utility
     prompts you for an IPX network number.

  Display All Records
     Use this option to display all RIP records
     stored in the DSS database on this server.
31« Save Database To Text File Help     Help 1 of 1
═════════════════════════════════════════════════  Enter the full path of the file in which to
 save the SAP or RIP database.2
0╝ Select SAP Type Help           Help 1 of 1
════════════════════════════════════════════════  This screen displays a list of SAP types
 to be used as selection criteria for viewing
 SAP records. To display all SAP records of a
 specific SAP type, select the SAP type from
 the list. 

 If the type of SAP you want to display records
 for is not listed on this screen, select OTHER
 TYPE from the list. The utility then prompts
 for a SAP type. 2	0= SAP Type Help                  Help 1 of 1
════════════════════════════════════════════════  Enter the SAP ID that corresponds to the
 service for which you want to view SAP
 records. A SAP ID is a two-byte integer
 (in hex) that represents a specific service.
 For example, the SAP ID for a file server is
 0x0004.

20┌ Server Name Help                  Help 1 of 1
════════════════════════════════════════════════  Enter name of the server for which you want
 to view SAP records. A valid server name can
 be from one to 48 characters.
		20 IPX Network Number Help            Help 1 of 1
════════════════════════════════════════════════  Enter the IPX network number of the network
 for which you want to display RIP records. 

 An IPX network number is a hexadecimal number
 that is one to eight digits (1 to FFFFFFFF).
wL31║ SAP Display Help                    Help 1 of 2
═════════════════════════════════════════════════  This screen displays a listing of all SAP
 records meeting the display criterion you
 selected. This screen contains the following
 information about each SAP entry:

 Server
     The name of the server from which the SAP
     originated.

 SAP ID 
     A code specifying the type of service.

 <Esc>=Exit Help                    <PgDn>=Next ÑJ20 SAP Display Help                   Help 2 of 2
════════════════════════════════════════════════  Sources 
     The number of servers that reported the
     service.  

 Select a specific SAP entry to see more
 information about the SAP record and its
 sources.31Φ RIP Display Help                  Help 1 of 1
═════════════════════════════════════════════════  This screen displays a listing of all RIP
 records meeting the display criterion you
 selected. This screen contains the following
 information about each RIP entry:

 Network Number
     The IPX network number of the RIP record. 

 Known Routes
     The number of sources reporting the route. 

 Select a specific RIP entry to see more
 information about the RIP record and its
 sources.

ßQ315 RIP Detail Help                     Help 1 of 3
═════════════════════════════════════════════════  This screen displays detailed information
 about a specific RIP record. This screen
 contains the following fields:

 IPX Network Number
     The IPX network number of the remote
     network.

 Reporting NetWare/IP Server
     The IP address of the NetWare/IP server
     that reported the RIP to the DSS.

 Reporting Server's Subnet
     The subnetwork address of the server that
     reported the RIP to the DSS.

 <Esc>=Exit Help                    <PgDn>=Next ^TöO31e RIP Detail Help                     Help 2 of 3
═════════════════════════════════════════════════ Time To Live
     The number of database synchronizations
     after which this RIP will be marked for
     deletion unless its status is updated. 

 Number of Hops
     The number of hops between a server on the
     remote network and the server that 
     reported the route to the DSS. If the value
     in this field is zero, the remote network
     is a TCP/IP network. If the value in this
     field is non-zero, the remote network is an
     IPX network.



 <Esc>=Exit Help                    <PgDn>=NextßQ31Y RIP Detail Help                     Help 3 of 3
═════════════════════════════════════════════════  Number of Ticks
     The amount of time in ticks (1/18 second) 
     it takes a packet to travel one-way
     between a server on the remote network
     and the server that reported the route to
     the DSS.

 Responsible DSS
     The DSS server to which the route was first      reported. The value in this field is
     either "this dss" or the IP address of
     another DSS server.

 DSS Database Flag
     A code specifying information about the
     RIP. This code is used internally by DSS.

█X31⌠ SAP Detail Help                     Help 1 of 4
═════════════════════════════════════════════════  This screen displays detailed information
 about a specific SAP record. This screen
 contains the following fields:

 Server Name
     The name of the server providing the
     advertised service.

 SAP ID
     A code specifying the type of service
     being advertised. For example, a SAP
     advertising a file server is a type 0x0004
     SAP.


 <Esc>=Exit Help                     <PgDn>=Next ■Z╧V31 SAP Detail Help                     Help 2 of 4
═════════════════════════════════════════════════ IPX Address
     A three-part address specifying the IPX
     address, node number, and socket number
     where the advertised service is available.

 Reporting NetWare/IP Server
     The IP address of the NetWare/IP server
     that reported the SAP to the DSS.

 Reporting Server's Subnet
     The subnetwork address of the server that
     reported the SAP to the DSS.



 <Esc>=Exit Help                    <PgDn>=Next ¡]█X31ù SAP Detail Help                     Help 3 of 4 ═════════════════════════════════════════════════ Time To Live
     The number of database synchronizations
     after which this SAP will be marked for
     deletion unless its status is updated.

 Number of Hops
     The number of hops between the server
     providing the service and the server
     advertising the service to the DSS. If the
     value in this field is zero, the advertised
     service resides on a NetWare/IP server. If
     the value in this field is non-zero, the
     advertised service resides on a native
     NetWare (IPX) server.
    
 <Esc>=Exit Help                    <PgDn>=Next ■Z20é SAP Detail Help                   Help 4 of 4
════════════════════════════════════════════════ Responsible DSS
     The DSS server to which the service was
     first reported. The value in this field is
     either "this dss" or the IP address of
     another DSS server.

 DSS Database Flag
     A code specifying information about the
     SAP. This code is used internally by DSS. 	
20" NetWare/IP Domain Name Help       Help 1 of 1
════════════════════════════════════════════════  Enter the fully qualified name of the
 NetWare/IP domain for which you want to
 display a DSS server listing. NetWare/IP
 domain names follow the same naming
 conventions as DNS domain names.

31Æ Display DSSes Help                  Help 1 of 1 ═════════════════════════════════════════════════  This screen displays a list of all known DSS
 servers for a specified NetWare/IP domain. The   utility obtains this listing by querying the     DNS and DSS servers. 

 For each DSS server entry, the utility displays  the name or IP address of the DSS server, the    DSS server type (primary or secondary), whether  or not the DSS server is registered with the     DNS name server, and the DSS server status       (active or inactive).

 The information displayed on this screen may be
 incomplete if any or all of the DSS or DNS 
 servers are not responding.╓e20ô DSS SAP Filtering Configuration    Help 1 of 2
════════════════════════════════════════════════  Use this form to configure DSS SAP filtering
  for the entire NetWare/IP network. DSS SAP
  filtering allows one to screen SAPs at the
  DSS level. At present, only Outbound
  filtering is supported i.e. one can control
  which SAPs get propagated to other DSSes.

  This form contains the following fields:

  SAP Filtering Enabled:
     This field can be used to turn on/off DSS
     SAP filtering. If SAP filtering is
     disabled, ALL SAPs are propagated to all
     the DSSes. If SAP filtering is enabled, 

 <Esc>=Exit Help                    <PgDn>=Next+c20 DSS SAP Filtering Configuration    Help 2 of 2
════════════════════════════════════════════════     ONLY the specified SAPs are permitted to
     propagate to other DSSes. If SAP filtering
     is enabled and no filters are specified,
     NO SAP will propagate from one DSS to
     another DSS.

  Filters:
     Press <Enter> to see the list of services
     that will propagate to other DSSes.

  Exceptions:
     Press <Enter> to see the list of services
     which are always NOT allowed to propagate
     to other DSSes..j20 Display DSS SAP Filters Help       Help 1 of 2 ════════════════════════════════════════════════  A DSS SAP filter specifies a set of SAPs in
  the NetWare/IP network. The set is composed
  from the following 3 components:

  IP Subnet/Net:
     The IP subnet/or net of the Netware/IP
     server reporting the SAP. "ALL" indicates
     that it doesn't matter where the SAP is
     reported from.

  SAP Type:
     The SAP ID associated with the SAP. "ALL"
     indicates ANY SAP ID.     


 <Esc>=Exit Help                    <PgDn>=Nextⁿg20 Display DSS SAP Filters Help       Help 2 of 2 ════════════════════════════════════════════════  Server Name:
     This indicates the name of the server from
     which the SAP is being advertised. Limited
     wildcarding is allowed in specifying
     server names eg. "ABC*" or "*"
20<This is the help screen for nwip configuration is detected.
20>This is the help screen for resolver information is detected.
20?This is the help screen for "detected DSS configuration" help.
8o42╝ IPX Networks Detected Help          Help 1 of 2 
═════════════════════════════════════════════════
 The NetWare/IP configuration utility has        
 detected that this server is bound to one or    
 more IPX networks and that the NetWare/IP       
 service is not configured as a forwarding       
 gateway.                                        
                                                 
 If you want to make IPX services and routes     
 available to IP-based hosts, you need to        
 configure a server as a forwarding gateway.     
                                                 
                                                 
 <Esc>=Exit Help                    <PgDn>=Next  
dl31╕ IPX Networks Detected Help          Help 2 of 2
═════════════════════════════════════════════════
 To configure a server as a forwarding gateway,
 complete the following steps:

 1. Make sure IPX is correctly bound to a
    network board and that IPXRTR is loaded
    without the "routing=none" parameter.

 2. On the NetWare/IP Server Configuration form,
    select YES in the "Forward IPX Information
    to DSS" field.

 <Esc>=Exit Help