InS_StArT
NE100ODI.COM
1.1
^Microdyne NE10/100 PCI Adapter,NE100ODI.COM,0000P0
?This is the DOSODI driver for the Microdyne NE10/100 PCI Adapter.
!00000P0(SPEED) Optional Line Speed
10
100
!0000P0(FORCEDUPLEX) Optional Force Duplex Mode
?Contact your Network Administator for the correct value.  An incorrect setting can cause network errors.
0
1
2
*0IEMAP0(FRAME) Frame Type
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
$0IEMAP0(NODE ADDRESS) Optional Adapter Node Address
020000000000
FEFFFFFFFFFF
InS_EnD

