InS_StArT
M32AODI.COM
1.0,
^PRO/100 Mobile Adapter32,M32AODI.COM,IEM
?Installation for the PRO/100 Mobile Adapter32.
*OIEM(FRAME) Frame type
?The latest ODI Specification uses Ethernet_802.2 as the default
?frame type.  If your network requires something other than
?Ethernet_802.2, then make sure to specify the correct frame type.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD
