InS_StArT
KTC20.COM
1.0
^Kingston EtheRx ISA PnP Ethernet Adapter,KTC20.COM,0E0
?This driver supports both the KTC20BT and KTC20T adapters
*O0E0(FRAME)Media Frame Type(s)
?NOTE: Ethernet_802.2 is now the default frame type for ODI Drivers.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP 
InS_EnD




 
