InS_StArT
IBMEINWC.COM
1.0
^IBM EtherJet ISA Adapter,IBMEINWC.COM,IE0
$OIE0(SERIAL)Serial Number
?This field is optional when there is only one IBM EtherJet ISA Adapter in the system.  When there are more than one, this field is required to distinguish between them.
1
FFFFFFFF
$OIE0(NODE ADDRESS)Node Address (optional)
0
FFFFFFFFFFFF
*RIE0(FRAME)Media Frame Type(s)
?NOTE:  Ethernet_802.2 is the default frame type for ODI Drivers.  Existing LANs may be using Ethernet_802.3.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD
