InS_StArT
DE500.COM
1.0
^DEC Fast EtherWORKS PCI 10/100 (DE500),DE500.COM,000
?Digital Fast EtherWORKS PCI DOS ODI Client Driver is the terminate-stay-resident (TSR) device driver for the DOS environment.  
$O000(PCI CARD)PCI Card Number ( default = 1 )                   
?Enter the PCI card (instance) number of the Digital Fast EtherWORKS PCI 10/100 adapter.
1
4
@1
*R000(FRAME)Media Frame Type(s)                                 
@ETHERNET_802.2
ETHERNET_II
ETHERNET_SNAP
ETHERNET_802.3
InS_EnD
