InS_StArT
DE43X.COM
1.0
^DEC EtherWORKS PCI (DE434/DE435),DE43X.COM,000
?Digital EtherWORKS TURBO PCI DOS ODI Client Driver is the terminate-stay-resident (TSR) device driver for the DOS environment. 
$O000(PCI CARD)PCI Card Number ( default = 1 )                   
?Enter the PCI card (instance) number of the Digital EtherWORKS Turbo PCI 10 adapter.
1
4
@1
*R000(FRAME)Media Frame Type(s)                                 
@ETHERNET_802.2
ETHERNET_II
ETHERNET_SNAP
ETHERNET_802.3
InS_EnD
