
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█  The EtherLink 16 adapter is supported by Novell's NetWare                  █
█  interconnectivity strategy, Open Data-Link Interface (ODI).                █
█                                                                             █
█  The utility program will update the EtherLink 16 adapter drivers (DOS and  █
█  OS/2 drivers) on an ODI workstation to the driver's currently released     █
█  version.  This utility program must be run on all ODI workstations         █
█  with an EtherLink 16 adapter installed.  A standard ODI workstation        █
█  installation must have been done on each system before attempting to       █
█  update the driver.                                                         █
█                                                                             █
█  This utility program will only run in DOS.  To update OS/2 drivers on an   █
█  OS/2 workstation, use the DOS window.  The program asks for the path       █
█  where the drivers are currently located, and then updates them.            █
█                                                                             █
█  Make sure that you are installing the latest driver.  Compare the date of  █
█  the NetWare driver for EtherLink 16 adapter on the EtherDisk diskette      █
█  with your current driver.                                                  █
█                                                                             █
█ 									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

