
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█                                                                             █
█  The EtherLink 16 adapter is supported by Novell's NetWare 286.  The        █
█  adapter can be selected during a standard NetWare 286 installation.        █
█                                                                             █
█  In NetWare 286, adapter drivers (LAN drivers) are linked into the          █
█  executable programs that support the network operating system on           █
█  workstations, file servers, and bridges.  The EtherDisk diskette assumes   █
█  NetWare 286's standard mechanism will be used for loading updated drivers  █
█  during the installation process.                                           █
█                                                                             █
█  The utility program will update the latest EtherLink 16 LAN drivers from   █
█  the EtherDisk diskette to an existing NetWare 286 network.  This utility   █
█  program will only work with NetWare 286 versions 2.15 and 2.2.             █
█                                                                             █
█  Make sure that you are installing the latest driver.  Compare the date of  █
█  the NetWare driver on the EtherDisk diskette with your current driver.     █
█                                                                             █
█                                                                             █
█                                                                             █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

