
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█  The EtherLink 16 adapter is not a selectable option during the standard    █
█  OS/2 EE installation.  The utility program supplied on the EtherDisk       █
█  diskette allows you to install the EtherLink 16 adapter driver in an       █
█  OS/2 EE system to the driver's currently released version.  Make sure that █
█  you have selected the EtherLink II adapter as the network controller       █
█  during the OS/2 EE installation and that the PROTOCOL.INI and CONFIG.SYS   █
█  files are not modified after the OS/2 EE installation.     	              █
█									      █
█  The utility program will save your original CONFIG.SYS and PROTOCOL.INI    █
█  files with the extensions ".old."  It will then modify these two files     █
█  so that the EtherLink 16 adapter will be your network controller when      █
█  you reboot the system.						      █
█									      █
█  Once the EtherLink 16 adapter driver has been installed in your OS/2 EE    █
█  system, running this utility program will only update the driver.          █
█                                                                             █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

