
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█                                                                             █
█  The EtherLink 16 adapter is supported by the 3Com 3+Open LAN Manager       █
█  network operating system.  The adapter can be selected during a standard   █
█  3+Open NOS installation.                                                   █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink 16 adapter drivers in a 3+Open system to the          █
█  drivers' currently released version.  Running the program will             █
█  automatically install the latest drivers from the EtherDisk diskette       █
█  into all computers (servers, DOS netstations, and OS/2 netstations)        █
█  running 3+Open with an EtherLink 16 adapter installed.  Also, run the      █
█  program on all 3+Open PC servers from which installations will be made     █
█  (including netstation startup diskette generation) for systems that        █
█  contain an EtherLink 16 adapter.                                           █
█									      █
█  This utility program will only work with 3+Open LAN Manager version 1.1.   █
█  Make sure that the adapter drivers are located in the directories they     █
█  were placed in during the initial installation.  If the drivers are        █
█  located in non-standard directories, you must manually copy the new        █
█  drivers from the EtherDisk diskette to these non-standard locations.       █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

