                                                                                   
                                                                                  
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█ The EtherDisk diskette provides you with the necessary software, utilities, █
█ and documentation to use 3Com's EtherLink 16 and EtherLink 16 TP adapters   █
█ with the most popular network operating systems (NOSs).  The diskette       █
█ also includes the diagnostic program, user information, and batch files     █
█ for updating drivers.  The adapter guide that comes packaged with the       █
█ adapter gives important information on adapter installation and use and     █
█ must be used in conjunction with the EtherDisk diskette.  Do not            █
█ write-protect the EtherDisk diskette while using it.                        █
█                                                                             █
█ Unless otherwise indicated, the term "EtherLink 16 adapter" refers to both  █
█ the EtherLink 16 (3C507) and the EtherLink 16 TP (3C507-TP) adapters.       █
█									      █
█ Before you update the network drivers make sure that:                       █
█       -  the adapter is installed in the computer                           █
█	-  the diagnostic program has been run (contained on the EtherDisk    █
█	   diskette)                                                          █
█	-  the computer is connected to the network			      █
█									      █
█ Select the Diagnostic Program and Miscellaneous Information options in      █
█ the main menu before updating the appropriate drivers.                      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

