


█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█    This menu provides you with the following options:		              █
█									      █
█    - Select option 1 to run the diagnostic and configuration program        █
█      to test or configure your EtherLink 16 or EtherLink 16 TP adapter.     █
█									      █
█    - Select option 2 to print or display the diagnostic and    	      █
█      troubleshooting information files.                                     █
█									      █
█    - Select option 3 to display the diagnostic program version.	      █
█									      █
█    - Select option 4 to return to the EtherDisk diskette main menu.	      █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

