
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█  The EtherLink Plus adapter is supported by Novell's NetWare                █
█  interconnectivity strategy, Open Data-Link Interface (ODI).		      █
█									      █
█  The utility program will update the EtherLink Plus adapter driver (DOS and █
█  OS/2 driver) in a DOS ODI workstation to the driver's currently            █
█  released version.  This utility program must be run on all DOS ODI	      █
█  workstations with an EtherLink Plus adapter installed.  A standard DOS ODI █
█  workstation installation must have been done on each system before	      █
█  attempting to update the driver.					      █
█									      █
█  Make sure that you are installing the latest driver.  Compare the date of  █
█  the NetWare driver for EtherLink Plus adapter on the EtherDisk diskette    █
█  with your current driver.						      █
█									      █
█  NOTE: Only the ODI drivers located in the root directory will be updated.  █
█  Before running the utility program make sure the ODI drivers you want to   █
█  update are located in the root directory.				      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

