
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█  The EtherLink Plus adapter is supported by the Novell NetWare 386 network  █
█  operating system.  The adapter can be selected during a standard NetWare   █
█  386 installation.							      █
█									      █
█  The utility program will update the EtherLink Plus adapter driver (LAN     █
█  driver) in a NetWare 386 server to the driver's currently released         █
█  version.  This utility program must be run on all NetWare 386 servers with █
█  an EtherLink Plus adapter installed.  A standard NetWare 386 server	      █
█  installation must have been done on each system before attempting to       █
█  update the driver.  The procedure will only work for NetWare 386 NOS       █
█  version 3.10 and greater.						      █
█									      █
█  Make sure that you are installing the latest driver.  Compare the date of  █
█  the NetWare driver on the EtherDisk diskette with your current driver.     █
█									      █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

