
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█  The EtherLink Plus adapter is not a selectable option during the OS/2 EE   █
█  installation. The utility program allows you to install the EtherLink      █
█  Plus adapter driver in an OS/2 EE system to the driver's currently         █
█  released version.  Make sure that you have selected the EtherLink II       █
█  adapter as the network controller during the OS/2 EE installation.  The    █
█  PROTOCOL.INI and CONFIG.SYS files must not be modified after the OS/2 EE   █
█  installation.							      █
█									      █
█									      █
█  The utility program will save your original CONFIG.SYS and PROTOCOL.INI    █
█  files with the ".old" extensions. It will then modify them so that the     █
█  EtherLink Plus adapter will be your network controller when you reboot     █
█  the system.								      █
█									      █
█									      █
█  You may want to customize the new PROTOCOL.INI file so that you can use    █
█  different interrupt level, DMA channel or I/O base address settings.       █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

