
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█    This menu provides you with the following options: 		      █
█									      █
█    - Select option 1 to run a utility program to automatically update the   █
█      NDIS drivers on your 3+Open server and/or workstation.		      █
█									      █
█    - Select option 2 to run a utility program to automatically update the   █
█      NDIS drivers on your Microsoft LAN Manager server and/or workstation.  █
█									      █
█    - Select option 3 to run a utility program to automatically update the   █
█      drivers on an IBM OS/2 LAN Server workstation and/or server.	      █
█									      █
█    - Select option 4 to return to the NDIS menu.			      █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█
