
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█  The EtherLink Plus adapter is supported by the Microsoft LAN Manager       █
█  network operating system.  The adapter can be selected during a standard   █
█  LAN Manager installation.						      █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink Plus adapter drivers in a LAN Manager system to the   █
█  drivers' currently released version.  Running the program will             █
█  automatically install the latest drivers from the Etherdisk diskette onto  █
█  all computers (servers, DOS workstations, and OS/2 workstations) running   █
█  LAN Manager with an EtherLink Plus adapter installed.  Also, run the       █
█  program on all LAN Manager systems from which installations will be made   █
█  or that will act as a Remoteboot server for systems that contain an	      █
█  EtherLink Plus adapter.						      █
█									      █
█  This utility program will only work with Microsoft LAN Manager version     █
█  2.0.  Make sure the adapter drivers are located in the directories they    █
█  were placed in during the initial installation.  If the drivers are	      █
█  located in non-standard directories, copy the new drivers (ELNKPL.DOS or   █
█  ELNKPL.OS2) from the \NDIS subdirectory to the non-standard locations.     █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

