
█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█  The EtherLink Plus adapter is supported by the 3Com 3+Open LAN Manager     █
█  network operating system.  The adapter can be selected during a standard   █
█  3+Open NOS installation.						      █
█									      █
█  The utility program supplied on the EtherDisk diskette allows you to       █
█  update the EtherLink Plus adapter drivers in a 3+Open system to the	      █
█  drivers' currently released version.  Running the program will             █
█  automatically install the latest drivers from the EtherDisk diskette       █
█  into all computers (servers, DOS netstations, and OS/2 netstations)	      █
█  running 3+Open with an EtherLink Plus adapter installed.  Also, run the    █
█  program on all 3+Open PC servers from which installations will be made     █
█  (including netstation startup diskette generation) for systems that	      █
█  contain an EtherLink Plus adapter.					      █
█									      █
█  This utility program will only work with 3+Open LAN Manager version 1.1.   █
█  Make sure the adapter drivers are located in the directories they were     █
█  placed in during the initial installation.  If the drivers are located in  █
█  non-standard directories, manually copy the new drivers (ELNKPL.DOS or     █
█  ELNKPL.OS2) from the \NDIS subdirectory to the non-standard locations.     █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

