█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█ The following requirements must be met before using LinkPlus Optimizer:     █
█									      █
█	- At least 256 KB of memory on the EtherLink Plus adapter.	      █
█	- 3+ NOS version 1.0 or later.					      █
█	- DOS version 3.1 or later.					      █
█	- IBM PC or compatible.  LinkPlus Optimizer cannot be installed       █
█	  on a 3Com 3Station or an Apple Macintosh computer.		      █
█									      █
█ If you start your computer from a hard disk, make sure you back up your     █
█ AUTOEXEC.BAT and CONFIG.SYS files to a diskette.  The installation	      █
█ procedure renames both files.  If you start your computer with a startup    █
█ diskette, you must use a blank diskette formatted with the /S option in the █
█ installation procedure.						      █
█									      █
█ For more information about installing the LPO, please refer to the	      █
█ 3+ LinkPlus Optimizer Installation Guide.				      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█
