


█▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀█
█									      █
█									      █
█    This menu provides you with the following options: 		      █
█									      █
█    - Select option 1 to run the diagnostic program to test your	      █
█      EtherLink Plus adapter.						      █
█									      █
█    - Select option 2 to print or display the diagnostic and		      █
█      troubleshooting information files.				      █
█									      █
█    - Select option 3 to display the diagnostic program versions.	      █
█									      █
█    - Select option 4 to return to the EtherDisk diskette main menu.	      █
█									      █
█									      █
█									      █
█									      █
█▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄█

