                               3Com Corporation
                EtherDisk Diskette for the EtherLink II Family
                         NetWare 4.0 Installation Help



  The EtherLink II adapter is supported by the Novell NetWare 4.0 network    
  operating system.  The adapter driver can be loaded after a standard       
  NetWare 4.0 installation.  To install the adapter for the first time,      
  use the standard NetWare 4.0 installation instead of this utility.  Type 
  LOAD INSTALL at the server console.  Follow the screens for loading or
  updating a LAN driver.  Press <INS> and type the path A:\NETWARE\NW40.
  This will copy the NetWare 4.0 server driver to the SYS:SYSTEM volume.

  The 3C503.LAN driver for NetWare 4.0 works only in conjunction with
  NetWare's 4.0 MSM.NLM and ETHERTSM.NLM.
                                                                             
  This utility program updates the EtherLink II adapter driver           
  (LAN driver) on an existing NetWare 4.0 server.  It updates the DOS    
  partition, or optionally the SYSTEM directory of the SYSTEM volume. 
  This utility program must be run on all Netware 4.0 servers with an             
  EtherLink II adapter installed.                                            
                                                                             
  To update the DOS partition, bring the server "DOWN" and exit to DOS.  
  Run the menus Update utility with the DOS partition as the target drive.
  To update the SYSTEM volume, log in as Supervisor.  Make sure to map to
  the SYSTEM directory.  Use the drive mapped to this directory for the
  target drive.     
                                                                             
  This utility works for NetWare 4.0 only.        


 
         (%VER  NetWare 4.0 Installation Help v3.4c)

