CONTENT FOR HELP

 RadioTrack

 Hardware Requirement

 Features

 RadioTrack Control Panel

 Key Functions


Requirements
 HardWare Requirement

To make sure that RadioTrack works optimumly , you need to have at least the following hardware :

 AT286 or above system running under Window 3.0 or above

1MB on-Board RAM

 VGA Monitor

 RadioTrack Card

 Stereo Speakers

  Antenna


 Features

FM Radio

Autoscan Tuning

Manual Tuning

Preset Tuning (Up to 99 stations)

Alarm Function

Slumber Function

Clock Display


Control Panel
RadioTrack Control Panel


 Key Functions

Button	Description	Function	Key
	Power On/Off	Off the radio	Q
	Help	Goto the help screen	H
	Fine Tune Set Alarm Min	Increase/decrease the tuning frequency by 0.025 MHz. Increase/decrease the minute setting of Alarm.	left/ right arrow
	Tune Up/Down Set Alarm Hour Set Slumer time	Increase/decrease the tuning frequency by 0.1 MHz.Increment/decrease the hour setting of Alarm Increment/decrease the minute setting of Slumber	up/ down arrow
	Scan	Used to set the radio into scan mode, i.e searching to the next station.
	Vol Up/Down	Increase/Decrease Volume	+/-
	Mute	Off the sound	M
	Slumber	Radio is mute after the predefined time  (in minutes)
	Slumber off	Turn off the slumber
	Alarm On	Radio is on at the predefined time	A
	Stations 1-99	Tune to any of the 99 predefine channel	0-9
	Memory Preset	Save the current frequency setting to one of the 10 preset station.	P
	Resize button	Click to resize the panel
	Product Logo	Click the logo would iconize the panel
		Set Radio Panel to be always on Top	T
		Set Radio Panel to normal mode (not always on Top)	N


Slumber Function

Activating The Function :

-	The function can be activated by pressing the 'Slumber on' button ['l' key].

-	Once activated, the count down time and the preset slumber time in minutes will be

displayed. The preset time is displayed on the left.

-	The display switches back to frequency display after a lapse of about 4 seconds or

when any button besides minute setting button is pressed.

Setting The Time :

-	Use the 'tune' button [Up or Down key]  to change the preset slumber time. Both

count down time and preset time will be adjusted. The slumber time can be in the

range 1-59 minutes.

-	After the slumber function is activated, you may change the slumber time by

repeating the steps described above.

-	You may check the remaining time that the radio will go into slumber by pressing

the 'slumber on' button. Do not click the 'tune' button as this would reset the

slumber time.

-	On time up, the radio and the slumber on indicator will be turned off.

Deactivating The Function :

-	To deactivate slumber,  press 'slumber off' button ['u' key] and the slumber on

indicator will  turn off.


Alarm Function

Activating The Alarm :

-	Press the 'Alarm' button ['a' key] to turn on the alarm. The alarm indicator on the

display will turn on.

-	The display will show the preset alarm time.

Setting The Alarm :

-	When the preset alarm time is shown, press the 'tune' button [up or down key] to

change the hour setting or 'fine tune' button [Left or Right key] to change the

minute setting.

-	The display switches back to frequency display after a lapse of about 4 seconds or

when any button besides the hour and minute setting button is pressed.

-	On time up, the radio will be turned on and  tuned to the last set station. The alarm

on indicator will be turned off.


99 Preset Stations

-	Tune to the desired station using Autoscan or Manual tuning.

-	Press 'mem' button follow by any preset button 1 - 99. Clicking elsewhere will

disable this function. After preseting the buttons, you may then press the preset

buttons to tune to the predefined channel.

-	Use [image] to select channel 11 - 99. For example, to select channel 45, click [image] four

times follow by [image]. After pressing  [image], you should press any button 1 - 10,

otherwise the current channel stays.


Autoscan

-	Press the 'scan' button to start autoscan mode. The radio will automatically seek to

the next available station and stop scanning.

-	The display will show that the radio is TUNED.


Manual Tuning

-	Use the 'Tune' button to adjust the frequency by 0.1 MHz. Use the 'fine' button if

fine tuning is required. Fine tune adjust the frequency by 0.025MHz.

-	Stop tunning when the display show that the radio is TUNED.