Changing Display Driver

This Display Driver Setup program provides you an easier way to select Trident display drivers and copy necessary files without going through the traditional Windows Setup. For example, you may want to change from standard VGA (640x480-16) mode to a high resolution TVGA mode, provided that you have the  appropriate hardware to support the change (e.g. 1MB memory for 1024x768-256, 2MB memory for 1280x1024-256, etc.). It also displays information of the current and selected drivers in Information Boxes.

NOTE:	You may need to restart Windows at the end of this Setup. For this reason, it is a good idea to close all applications before you use Setup.

To change your display driver:

1. Make sure that your hardware is compatible with the driver you are about to use. Check your hardware documentation.

2. Use arrow keys or the mouse to select which driver set you want.

3. Use arrow keys or the mouse to select the driver (mode or resolution) that you want.

4. Choose the Setup button or double click the selected driver.

5. If the driver has been selected before, or if an old version exists, you will be asked (in a Change System Settings box) whether you want to use the currently installed driver, a new driver, or cancel the operation. Make the appropriate choice.

6. Choose Restart Windows button or Continue button. Note that Windows MUST be restarted in order to have the driver change to be in effect.


Information Box

The Information Boxes for the current and selected driver contain the following:

.  Driver file name

.  File data and time

.  File size

.  Driver description


Change System Settings

Use this dialog box to select which version of the given display driver you want to use (current driver, new driver, or cancel).

You can choose one of the following buttons in the dialog box.

Current	Keep the existing, installed driver on your system.

New	Delete the existing driver and install the new driver in its place.

Cancel	Close the dialog box and leave your system as it was.