This is the Help file for panaStation v1.00. It may be no larger than
48K in size or strange things will happen. The help messages may be
modified, as long as the "tags" (single words preceded by a ":") are
not changed. One possible reason to modify this file is to translate
it into a foreign language. WARNING: Do not start any line with a
colon (":") character because it will be mistaken for a help tag.

Copyright (c) 1993  Panacea Inc. - All Rights Reserved

:Intro
                       Welcome to panaStation!

    The following configuration utility is used to configure 
    panaStation for the board type, and resolution you wish to run
    MicroStation with. This utility will create a file called 
    PANACFGx.DAT in the MicroStation main sub-directory specified 
    when MicroStation was installed. PANACFGx.DAT contains
    panaStation's configuration information.
    
    At any time while you're configuring panaStation, you may press 
    the question-mark key ("?") to get context sensitive help.    

:DrvConfig
Choose this menu to select the graphics board and
Display/Rendering resolution to use with MicroStation.

:AspectRatio
Choose this menu to enter the dimensions of your video monitor in
millimeters.

:ScreenHeight
Measure the height of the displayed area on your monitor in millimeters
and enter it here.

:ScreenWidth
Measure the width of the displayed area on your monitor in millimeters
and enter it here.

:SaveExit
Saves your current configuration.

:SaveNoExit
Exits WITHOUT saving your current configuration.
Any configuration changes will be lost.

:BoardSelect
Highlight a video card and the press ENTER. If the list does not include
your specific brand of graphics board, select the Generic option for your
card's video chip-type.

:returnPrev
Choose this option to return to the previous menu.

:ManualBoard
Choose this menu to select your graphics board.

:ReturnMain
To return to panaStation's Main Menu, select this option.

:pickRes
Highlight an available Display/Rendering resolution and press ENTER.
Please note that the resolution selected will depend on the capability
of your video board to support it.

:SelectRes
Choose this menu to select your Display/Rendering resolution.

:YesNo
If you do not wish to save your panaStation configuration changes, select 
"YES".  If you wish to return to the panaStation configuration Main Menu, 
then select "NO".

:EndOfFile
