/*----------------------- Windows 3.x Help -------------------------------*/
HelpWin:

  Orchid Windows 3.x HyperDriver for the Fahrenheit

  The table below lists the resolutions and colors available for  
  the Fahrenheit boards.
 
  Resolutions   Color           Memory     Refresh Rates
  ---------------------------------------------------------------
   640 x 480    16 colors       1MB        60Hz, 72Hz
   640 x 480    256 colors      1MB        60Hz, 72Hz
   640 x 480    32,768 colors   1MB        60Hz, 72Hz
   640 x 480    65,536 colors   1MB        60Hz, 72Hz
   640 x 480    16.7M colors    1MB        60Hz
   800 x 600    16 colors       1MB        56Hz, 60Hz & 72Hz
   800 x 600    256 colors      1MB        56Hz, 60Hz & 72Hz
   800 x 600    32,768 colors   1MB        60Hz
   800 x 600    65,536 colors   1MB        60Hz
  1024 x 768    16 colors       1MB        43.5(i)Hz, 60Hz & 70Hz
  1024 x 768    256 colors      1MB        43.5(i)Hz, 60Hz & 70Hz
  1280 x 960    16 colors       1MB        45(i)Hz, 48(i)Hz
  1280 x 1024   256 colors      2MB        45(i)Hz, 48(i)Hz

  Notes:
  
  2MB only available on Fahrenheit VLB & VA/VLB 
  (i) interlaced mode.
  
  Installation:
 
  This program will automatically install the Orchid Windows HyperDriver and
  the Orchid Windows utility "ORCHID SETUP".

  Using the Orchid Windows HyperDriver:
  -------------------------------------

  To configure the HyperDriver to display in a different resolution,
  number of colors or menu font size use "ORCHID SETUP".

  For Windows 3.1, "ORCHID SETUP" is located inside the Control Panel.
		   
		   Select the Orchid Icon within the Windows Control Panel
		   to open the Orchid Setup Utility.  

  For Windows 3.0, "ORCHID SETUP" Icon is located on the  Windows desktop.
		      
  Note: Windows 3.0 only runs in Standard and Enhanced Mode.


  Configuring the Orchid Voice Notes Application and Sound Driver:
  ---------------------------------------------------------------

  The drivers and application will automatically be loaded into your
  Windows 3.1 system files.  When you enter Windows drag the Voice Note 
  Icon from its Group to your Windows Start-up Group.  Restart Windows
  to activate Voice Notes (Fahrenheit VA & Fahrenheit VA/VLB Boards 
  only).   
  
  If a problem occurs follow the manual installation listed below:

  1. Select the Control Panel Icon under the Main Group. 
  
  2. Select the Drivers Icon under the Control Panel Group.
  
  3. Select the ADD Button for additional drivers.

  4. Select the "Orchid Fahrenheit VA" driver from the Menu. 
  
  5. Select "Current" drive already on system.

  6. The Sound Driver has now been installed.

  7. Drag the icons from the "Drag icon to Startup" Group to your 
     "Start-Up" Group.  
  
  You are now ready to restart Windows and the Orchid Voice Note 
  application will automatically start.

  Norton Desktop for Windows Users:
  ---------------------------------
  Due to the way Norton Desktop for Windows modifies the GRP 
  configuration, you will have to load the Windows applications 
  manually.  Use the File Manager and drag the following EXE into 
  your Start-up Group:

  C:\ORCHID\ORCHNOTE.EXE
  C:\ORCHID\MAGNIFY.EXE

  Please reference your Microsoft Manual for more information on how
  to add Windows applications to a Window Group.


  IMPORTANT!!!!

  If you select either 1280 x 960 or 1024 x 768 resolution in configuring
  the Orchid HyperDriver, please be sure your monitor can support these
  extended modes.  If your monitor does not support the above resolutions,
  you will receive a scrambled display. If this happens, delete the 
  ORCHID.INI file from the Windows directory. Restart Windows and then 
  rerun the Orchid Setup Utility to select a compatible resolution. If 
  you are not sure if your monitor can run these resolutions, we recommend 
  the following actions:

  1. Check the Fahrenheit switch settings
  2. Check your monitor manual
  3. Contact your Dealer
  
EndWin:
