         SYNWATCH software line analyzer

Synwatch is a software ISDN line analyzer. It allows you to visualize and analyze the outgoing and incoming data flow on your Syncard 96 ISDN adapter.

A large range of fonctionnalities is available.

Caution!
Using Synwatch requires a good knowledge in ISDN networks and in PPP protocol.


Main Screen help
Main Screen help (Click and see !)


Options
Options (Click and see !)


Statistics

Allows you to visualize the data transmission statistics on the physical ports.


Max Trace Size

Allows you to specify the maximum watchable size for the selected port.


ASCII

Trace will be displayed in ASCII format.


EBCDIC

Trace will be displayed in EBCDIC format.


Ok

Validate the selected options.


Cancel

Go back to main screen without saving the modifications.


Default

Set default values.


Help

Load the SYNWATCH on line help


Save trace

Allow you to save trace as a file onto your hard disk.


Read Trace File

Allow you to search for a previous trace file on your hard disk and visualize it.


Purge trace screen

Delete the whole trace window.


Recording...

Reactivate the trace function after the use of the Pause button.

Pause...

The coming events are not displayed, but bufferized until you press the Record button.


Hardcopy

Hardcopy the trace window into the Windows clipboard.


D Channel

Enables the trace mode for D channel.

B1 and B2 channel

Enables the trace mode for B channels.


Trace Mode

Specifies the mode in which the transmitted data are displayed. The possible values are :

For D channel

-	Hexadecimal

-	Reduced

-	Full

For B channels

-	Hexadecimal

-	X25

-	PPP


Trace window

The data transmitted on the enabled physical port (D, B1, B2) will be displayed in this area, according to the selected trace mode. You can use the search string function to navigate in this trace window.


File Menu

Save	saves file to disk
Read	reads a trace file from disk


Edit Menu

Select All	selects all the trace window

Copy	copies to clipboard

Clear	purges the whole trace window

Freeze	stops recording after run

Run	starts recording after freeze

Find...	searches a string in the trace


Watch Menu

ISDN D Channel	activates trace for D channel

ISDN B1 Channel	activates trace for B1 channel

ISDN B2 Channel	activates trace for B2 channel


Options Menu

Watch	visualizes the SYNWATCH trace mode options

Font	allows to specifiy the windows font for SYNWATCH


Instant Help

Displays instantaneously the function of the button on which the mouse is positionned.


Physical port

Indicates the physical port, the statistics on which are displayed.


Baud rate

Baud rate for the physical port.

Rx for received data

Tx for transmitted data


Color code

The LEDs will inform you of the status of the physical port:

D channel

Off	no data transmission

Yellow	data transmission

B channels

Off	no data transmission

Green	connected but no data transmission

Yellow	connected and data transmission