                      ISDN Magic Eye !

SYNEYE is a very usefull application which will inform you of the physical status of your ISDN line.

With these information, you will have the possibility to tune your system and applications to really implement an efficient cost management policy.

A large range of functionnalities is available.


Main Screen Help
Main Screen Help (Click and See !)


Advanced / Standard

When SYNEYE is running in Standard mode, only the LEDs are displayed. It is sufficient to inform you on the status of the physical link (see color code).

If you want the baud rate to be displayed (Kbit/s), swith to Advanced mode.


Color code

The LEDs will inform you of the status of the physical port:

D channel

Off	no data transmission

Yellow	data transmission

B channels

Off	no data transmission

Green	connected but no data transmission

Yellow	connected and data transmission


Baud Rate

Baud rate for the physical port (Kbits/s).

Rx for received data

Tx for transmitted data