                      ISDN Line Test

ISDNTEST allows you to rapidly and easily test your ISDN line. Basic troubleshootings as electric, hardware connectivity or ISDN compatibility problems will be raised.

This test is base on a loopback ISDN call over both B channels.

A large range of functionnalities is available.


Main Screen Help
Main Screen Help (Click and See !)


Test

Starts the ISDN line testing procedure.


Test Menu

Test	starts the testing procedure

Display event list	open the event list window

Record all events	to record all the testing events

Parameters	to specify ISDN testing parameters

Save / Save as	to save the testing events and diagnostics


Parameters
Parameters (Click and See !)


Iterations count

This parameter allows you to specify the number of automatic retries to be achieved during the loopback test.


Sub-address

In this situation, the ISDN sub-address allows to differenciate two physical equipments that are connected on the same ISDN bus. To prevent equipment B from answering equipment A (testing), take care to specify different sub-addresses.


Diagnostic

In this area of the screen, some diagnostics or error messages will be displayed. The Test Ok message means that the test passed.


Visual test

This area of the screen allow you to observe the testing procedure.


ISDN local number

Specify in this field, the ISDN number of the workstation which is running the test. Caution, if several equipments are connected on the same ISDN bus, it is necessary to differenciate them with an ISDN sub-adress.


Help

Load the ISDNTEST on line help.


Event list

This option allows you to open a new window in which every step of the ISDN testing procedure will be displayed.

This will be very usefull in case of problem.