Copyright: Copyright © 1993-1996 TELES AG Berlin


ISDN Adapter Installation

When installing for the first time, the Windows 95 Hardware Assistant will be launched automatically to guide you through the installation process. Several installation dialogs will follow, prompting you to set up your ISDN adapter.

Clicking on the button Next will lead you to the following dialog, Back turns to the previous dialog, allowing to change previous settings.

First you are asked if the Hardware Assistent should be looking for new hardware.

Click No to install your adapter manually. Click Next.

In the following listbox, select the entry Other Components and click Next. Click on the button Have Disk... in the next dialog.

Then enter the installation directory plus the preferred language on your CD (e.g. ...\ENG) or select it in a file dialog with click on the button Browse. Click OK.

The next dialog displays a list of ISDN adapters available. Select your own adapter from the list and click Next. The window Hardware Settings appears and the installation is now ready to begin.

After successful installation you are asked to restart Windows to let the changes take effect.

NOTE: The Hardware Settings shown in the beginning of the installation can be easily changed afterwards using the System | Device Manager from your Control Panel.


TELES.BRI/PnP Board Installation

If you have a TELES.BRI/PnP board installed, the Windows 95 Hardware Assistant launches automatically with the Windows start displaying the message box New Hardware Found.

Select the option Driver from disk of hardware manufacturer and click OK.

Make sure the TELES.ISDN CD is in your CD-ROM drive. You will find the necessary drivers in the directory ...\DEUTSCH.

Click OK to start the installation program.

NOTE: If you already have your BRI/PnP board configured in the Windows 95 Device Manager before this installation, you will get the message that your board was not set up properly using the Plug & Play function.

For correct installation, the adapter has to be removed first.

Open the Device Manager from the Control Panel and click on the entry Other Components. Select the BRI/PnP adapter and click on Remove.

After restarting Windows the BRI/PnP board can be installed as described above.